230 SAFFE, NÚÑEZ, & LEVATO

TABLE 10 LINE ABUNDANCES OF HR 8567

Code Species Mult. λ(Å) log gf Ref. Weq log(N/NT ) Code Species Mult. λ(Å) log gf Ref. Weq log(N/NT )

6.01 C II 4 3918.97 −0.53 WF 15 −3.76 24.01 Cr II 44 4616.63 −1.29 MF 50 −5.34 6.01 C II 4 3920.68 −0.23 WF 26 −3.53 24.01 Cr II 44 4634.07 −1.24 MF 62 −4.96 6.01 C II 6 4267.26 0.72 WF 15 −4.19 24.01 Cr II 178 4697.60 −1.88 MF 9 −5.31 8.00 O I 12 5330.73 −0.87 WF 28 −3.09 24.01 Cr II 30 4812.34 −1.80 MF 30 −5.53 12.00 Mg I 2 5183.60 −0.16 WS 8 −5.14 24.01 Cr II 30 4836.23 −2.25 MF 31 −5.06 12.01 Mg II 10 4390.57 −0.53 WS 31 −4.95 24.01 Cr II 30 4848.23 −1.14 MF 54 −5.46 12.01 Mg II 9 4427.99 −1.21 WS 10 −4.88 24.01 Cr II 30 4884.61 −2.08 MF 24 −5.43 13.01 Al II 2 4663.05 −0.28 FW 8 −6.52 24.01 Cr II 190 4912.46 −0.95 KX 19 −5.43 14.01 Si II 1 3853.66 −1.44 LA 56 −4.99 24.01 Cr II 43 5232.50 −2.09 KX 21 −5.42 14.01 Si II 1 3856.02 −0.49 LA 107 −4.89 24.01 Cr II 43 5237.33 −1.16 MF 59 −5.11 14.01 Si II 1 3862.59 −0.74 LA 88 −4.98 24.01 Cr II 23 5249.44 −2.43 KX 16 −5.40 14.01 Si II 3.01 4075.45 −1.40 SG 16 −4.72 24.01 Cr II 43 5274.96 −1.29 KX 49 −5.35 14.01 Si II 3.01 4076.78 −1.67 SG 19 −4.35 24.01 Cr II 43 5308.44 −1.81 MF 37 −5.19 14.01 Si II 3 4130.89 0.53 LA 114 −4.73 24.01 Cr II 43 5310.70 −2.28 MF 20 −5.25 14.01 Si II 5 5041.02 0.29 SG 73 −4.77 24.01 Cr II 43 5313.59 −1.65 MF 43 −5.18 16.01 S II 44 4153.07 0.62 WS 12 −4.79 24.01 Cr II 43 5334.87 −1.56 KX 40 −5.37 16.01 S II 44 4162.66 0.78 WS 14 −4.82 25.00 Mn I 2 4030.75 −0.47 MF 31 −4.50 16.01 S II 9 4815.55 0.18 WM 13 −4.93 25.00 Mn I 2 4033.06 −0.62 MF 49 −3.76 16.01 S II 1 4991.97 −0.65 WS 7 −4.45 25.00 Mn I 2 4034.48 −0.81 MF 16 −4.63 16.01 S II 15 5014.04 0.03 KX 14 −4.47 25.00 Mn I 5 4035.72 −0.19 KX 12 −4.33 16.01 S II 7 5032.43 0.18 WS 15 −4.71 25.00 Mn I 5 4041.35 0.29 MF 30 −4.25 16.01 S II 39 5212.62 0.24 WS 4 −4.93 25.00 Mn I 5 4058.93 −0.45 MF 8 −4.25 20.01 Ca II 1 3933.66 0.13 WM 280 −5.35 25.00 Mn I 23 4235.14 −0.26 KX 14 −3.81 21.01 Sc II 7 4246.82 0.24 LD 54 −7.61 25.00 Mn I 28 4455.01 −0.39 KX 11 −3.76 22.01 Ti II 34 3900.54 −0.45 MF 66 −5.97 25.00 Mn I 28 4462.03 0.32 MF 11 −4.46 22.01 Ti II 34 3913.46 −0.53 MF 70 −5.78 25.00 Mn I 22 4470.14 −0.44 MF 5 −4.16 22.01 Ti II 31 3932.02 −1.78 MF 23 −5.99 25.00 Mn I 21 4709.71 −0.34 MF 6 −4.14 22.01 Ti II 87 4028.34 −1.00 MF 31 −6.19 25.00 Mn I 16 4754.04 −0.09 MF 14 −4.32 22.01 Ti II 105 4163.64 −0.40 MF 48 −5.96 25.00 Mn I 21 4761.51 −0.14 MF 8 −4.20 22.01 Ti II 41 4290.22 −1.12 MF 54 −5.74 25.00 Mn I 16 4783.43 0.04 MF 17 −4.30 22.01 Ti II 19 4294.09 −1.11 MF 61 −5.55 25.01 Mn II I 3878.99 −1.71 KX 55 −4.16 22.01 Ti II 41 4301.92 −1.16 MF 35 −6.28 25.01 Mn II I 3917.32 −1.15 KX 43 −4.47 22.01 Ti II 41 4312.86 −1.16 MF 43 −6.04 25.01 Mn II I 3930.95 −2.15 KX 23 −4.29 22.01 Ti II 94 4316.79 −1.42 MF 11 −6.31 25.01 Mn II I 3952.42 −1.50 KX 23 −4.35 22.01 Ti II 41 4320.95 −1.87 MF 38 −5.49 25.01 Mn II I 3986.58 −2.60 KX 28 −4.20 22.01 Ti II 104 4386.85 −1.26 MF 29 −5.62 25.01 Mn II I 3995.31 −2.44 KX 24 −4.52 22.01 Ti II 19 4395.03 −0.66 MF 65 −5.83 25.01 Mn II I 4000.05 −1.21 KX 40 −4.11 22.01 Ti II 61 4395.84 −2.17 MF 14 −5.86 25.01 Mn II I 4081.44 −2.24 KX 41 −3.83 22.01 Ti II 115 4411.07 −1.06 MF 20 −5.84 25.01 Mn II I 4087.91 −2.91 KX 12 −4.47 22.01 Ti II 40 4417.71 −1.43 MF 40 −5.88 25.01 Mn II I 4140.44 −2.46 KX 26 −4.35 22.01 Ti II 19 4443.80 −0.70 MF 58 −6.06 25.01 Mn II 2 4174.32 −3.55 KX 58 −4.08 22.01 Ti II 19 4450.48 −1.45 MF 25 −6.29 25.01 Mn II I 4180.06 −2.83 KX 13 −4.46 22.01 Ti II 31 4468.49 −0.60 MF 61 −6.04 25.01 Mn II I 4184.45 −1.95 KX 38 −4.18 22.01 Ti II 115 4488.32 −0.82 MF 24 −5.94 25.01 Mn II I 4200.27 −1.74 KX 48 −4.06 22.01 Ti II 50 4533.96 −0.77 MF 65 −5.67 25.01 Mn II 2 4205.38 −3.38 KX 66 −3.92 22.01 Ti II 41 4563.76 −0.96 MF 54 −5.86 25.01 Mn II I 4240.39 −2.07 KX 40 −4.01 22.01 Ti II 59 4657.20 −2.15 MF 11 −5.98 25.01 Mn II 7 4244.25 −2.39 KX 44 −3.95 22.01 Ti II 92 4779.98 −1.37 MF 27 −5.84 25.01 Mn II I 4251.73 −1.06 KX 61 −4.29 22.01 Ti II 82 4805.09 −1.10 MF 32 −5.97 25.01 Mn II 2 4260.46 −4.25 KX 25 −4.41 22.01 Ti II 114 4874.01 −0.79 MF 12 −6.38 25.01 Mn II I 4377.74 −2.14 KX 29 −4.64 22.01 Ti II 114 4911.20 −0.34 MF 27 −6.32 25.01 Mn II I 4391.96 −2.89 KX 12 −4.45 22.01 Ti II 113 5072.29 −0.75 MF 11 −6.44 25.01 Mn II I 4393.38 −2.32 KX 31 −4.36 22.01 Ti II 86 5129.16 −1.39 MF 21 −6.06 25.01 Mn II I 4403.51 −1.80 KX 23 −4.59 22.01 Ti II 86 5185.90 −1.35 MF 30 −5.84 25.01 Mn II I 4478.64 −0.95 KX 56 −4.34 22.01 Ti II 7 5188.69 −1.21 MF 35 −5.99 25.01 Mn II I 4497.94 −2.59 KX 16 −4.59 22.01 Ti II 70 5226.54 −1.30 MF 26 −6.15 25.01 Mn II I 4503.20 −2.16 KX 26 −4.43 24.01 Cr II 167 3865.60 −0.78 KX 50 −5.26 25.01 Mn II I 4509.22 −3.60 KX 8 −3.97 24.01 Cr II 129 3911.32 −2.06 KX 13 −5.32 25.01 Mn II 17 4510.21 −0.72 KX 17 −3.98 24.01 Cr II 183 3979.50 −0.73 KX 36 −5.58 25.01 Mn II I 4689.55 −2.54 KX 24 −4.02 24.01 Cr II 19 4051.93 −2.19 KX 30 −5.55 25.01 Mn II I 4702.73 −2.34 KX 15 −4.50 24.01 Cr II 26 4072.56 −2.41 KX 25 −5.16 25.01 Mn II I 4717.26 −1.86 KX 27 −4.43 24.01 Cr II 165 4082.28 −1.23 KX 16 −5.83 25.01 Mn II I 4730.40 −2.15 KX 52 −3.90 24.01 Cr II 26 4086.13 −2.42 KX 15 −5.48 25.01 Mn II I 4749.11 −2.00 KX 23 −4.57 24.01 Cr II 181 4127.06 −1.77 KX 10 −5.40 25.01 Mn II I 4791.78 −1.72 KX 41 −4.28 24.01 Cr II 26 4132.42 −2.35 KX 15 −5.54 25.01 Mn II I 4806.82 −1.56 KX 66 −3.93 24.01 Cr II 26 4179.42 −1.77 KX 29 −5.63 25.01 Mn II I 4830.06 −1.85 KX 39 −4.23 24.01 Cr II 31 4275.57 −1.70 KX 51 −5.02 25.01 Mn II I 4839.74 −1.86 KX 32 −4.43 24.01 Cr II 191 4465.73 −1.18 KX 9 −5.65 25.01 Mn II I 4842.32 −2.01 KX 39 −4.05 24.01 Cr II 44 4554.99 −1.38 MF 50 −5.25 25.01 Mn II I 5102.52 −1.93 KX 48 −3.91 24.01 Cr II 39 4565.74 −2.11 MF 33 −5.08 25.01 Mn II I 5307.35 −2.07 KX 17 −4.25 24.01 Cr II 44 4588.20 −0.63 MF 80 −4.96 25.01 Mn II I 3902.36 −2.72 KX 13 −4.53 24.01 Cr II 44 4592.05 −1.22 MF 54 −5.28 26.00 Fe I 4 3859.91 −0.71 N4 10 −4.68