HD 50896 WIND STRUCTURE 263

TABLE 1 JOURNAL OF OBSERVATIONS FOR THE OGH SPECTRA AND LINE FIT PARAMETERS^a

ID JD Day n Δt ϕ V_{max} X_0 X_1 R_1 X_2 R_2 X_3 R_3 X_4 Type

OGH I (Jan-Feb 1999) b24 1202.80 24 9 1.0 0.71 40 0.1 90 1.25 380 1.90 210 3.1 10. a b25 1203.73 25 35 6.0 0.96 34 0.1 40 1.38 370 2.10 160 2.9 10. a b26 1204.82 26 3 0.5 0.25 34 0.1 45 1.25 320 2.00 180 2.6 10. a b27 1205.71 27 25 5.0 0.48 40 0.1 45 1.45 710 2.00 60 2.7 0.1 s b28 1206.76 28 15 2.0 0.76 34 0.1 50 1.25 310 1.90 220 2.4 70 a b30 1208.70 30 19 2.7 0.28 38 0.1 40 1.30 410 1.88 180 2.95 60 a b31 1209.70 31 10 2.0 0.54 42 0.1 45 1.30 640 1.90 40 2.7 0.1 s b2 1211.70 02 35 6.0 0.07 38 0.1 46 1.40 500 2.00 70 3.0 0.1 w OGH II ( Nov 2005) n19 3693.84 19 8 1.0 0.37 34 20. 50 1.35 320 1.9 140 3.1 50. a n20 3694.96 20 10 2.7 0.64 36 0.1 55 1.30 360 1.95 75 2.7 0.1 w n21 3695.97 21 15 2.2 0.91 35 20. 50 1.25 370 1.85 110 3.1 50. a n22 3696.98 22 20 5.0 0.17 40 0.1 45 1.40 650 1.85 20 2.7 0.1 s n23 3697.96 23 7 1.0 0.44 35 0.1 50 1.25 270 1.70 140 3.8 50 a n24 3698.95 24 5 1.0 0.70 33 0.1 60 1.35 340 1.95 33 2.9 80 w n25 3699.98 25 10 2.7 0.97 33 0.1 40 1.40 400 2.20 93 2.9 0.8 w n26 3700.87 26 20 5.0 0.21 40 0.1 45 1.40 700 1.85 8 2.7 0.1 s OGH III (Feb 2009) d02 4864.82 02 15 1.0 0.36 33 0.1 60 1.46 400 2.05 73 2.9 0.1 w d03 4865.74 03 20 2.7 0.60 38 0.1 43 1.40 520 2.00 40 2.7 0.1 s d04 4866.77 04 14 2.2 0.88 34 0.1 60 1.30 280 1.90 140 2.8 40 a d05 4867.75 05 22 5.0 0.14 38 10. 60 1.40 420 1.80 90 2.8 1 w d06 4868.77 06 20 1.0 0.41 36 10. 60 1.39 400 2.0 60 3.0 0.1 w d07 4869.78 07 15 1.0 0.68 35 0.1 45 1.40 400 2.00 45 2.7 0.1 s d08 4870.71 08 6 2.7 0.92 34 0.1 60 1.38 250 1.80 110 3.0 60 a aMean Julian dates (−2450000) for the time interval (Δt) over which the data n spectra were collected. Phase (ϕ) is computed with the Georgiev et al. (1999) ephemeris. The fit parameters are described in the text. For all cases, Rmax = 4.2 R∗, Ra = 3.9 R∗ and Vth = 50 km s^{−1}.

TABLE 2 JOURNAL OF OBSERVATIONS FOR THE SPM SPECTRA AND LINE FIT PARAMETERS^a ID JD n Δt Phase Vmax X0 X1 R1 X2 R2 X3 R3 X4 Type

a 280.9 1 – 0.63 36 0.1 47 1.21 410 2.02 30 2.9 0.1 s b 281.8 22 4.5 0.87 37 0.1 59 1.40 510 2.05 18 3.0 0.1 s c 282.8 34 6.1 0.14 34 0.1 90 1.40 250 1.95 130 3.2 9 a e 284.8 30 5.7 0.67 31 0.1 10 1.20 330 2.2 58 2.9 1 w f 285.8 22 5.1 0.93 37 0.1 67 1.36 460 2.02 20 2.8 0.1 s g 286.8 32 4.9 0.20 34 0.1 90 1.27 220 1.85 130 3.2 9 a h 287.8 35 4.5 0.47 31 0.1 30 1.30 290 2.1 78 2.9 1 w i 288.7 7 0.6 0.70 31 0.1 30 1.40 340 2.2 58 3.0 1 w j 289.8 34 5.5 0.00 35 20 51 1.35 390 2.12 37 2.8 0.1 s k 290.7 7 3.4 0.24 34 0.1 90 1.35 260 1.7 120 3.5 9 a l 291.8 40 4.4 0.53 31 0.1 30 1.40 340 2.24 60 3.0 1 w aMean JD’s are −2448000. Other parameters as in Table 1.