ATMOSPHERIC AEROSOL OVER SAN PEDRO MÁRTIR 419

Fig. 4. Annual AOT behavior at the SPM location by monthly average at 470 nm (top), 550 nm (second from top to bottom), 660 nm (third from top to bottom), and 2130 nm (bottom). The color figure can be viewed online.