-0.8 -0.4 0.0 0.4

-0.8

-0.4

-0.0

0.4

0.8

1.2 AGN TO SFG U (1.0Z_o) O (log U = -3.7)

model SFG model AGN

0.5Z_o

3.4Z_o

2.4Z_o

0.3Z_o

2.5Z_o

0.5Z_o

N (log U = -3.7)

1.0Z_o

10^{-2.5}

10^{-4}

0.5 X N_o

3.0 X N_o

Log([NII]/Hα)

Log([OIII]/Hβ)