330 ARELLANO FERRO

We have not been able to determine a reliable calibration that can predict the absolute magnitude M_V for F-G supergiant stars from photometric indices as accurately as from the strength of the OI 7774 feature.

Numerous comments and suggestions made by Prof. Sunetra Giridhar and an anonymous referee are thankfully acknowledged. This work was supported by DGAPA-Universidad Nacional Autónoma de México grant through project IN114309. This research has made extensive use of the Simbad data base operated at CDS, Strasbourg, France and of the NASA ADS Astronomy Query Form.

REFERENCES Arellano Ferro, A., Giridhar, S., & Rojo Arellano, E.

2003, RevMexAA, 39, 3

A. Arellano Ferro: Instituto de Astronomía, Universidad Nacional Autónoma de México, Apdo. Postal 70-264, México D.F. 04510, Mexico (armando@astro.unam.mx).

Arellano Ferro, A., & Mendoza, E. E. 1993, AJ, 106, 2516 Arellano Ferro, A., & Parrao, L. 1990, A&A, 239, 205 Arellano Ferro, A., Rojo Arellano, E., González-Bedolla, S., & Rosenzweig, P. 1998, ApJS, 117, 167 Bravo-Alfaro, H., Arellano Ferro, A., & Schuster, W. H.

1997, PASP, 109, 958 Gray, R. O. 1991, A&A, 252, 237 Lester, J. P., Gray. R. O., & Kurucz, R. L. 1986, ApJS, 61, 509 Luck, R. E., & Bond, H. E. 1989, ApJS, 71, 559 Luck, R. E., & Lambert, D. L. 1985, ApJ, 298, 782 Lyubimkov, L. S., Lambert, D. L., Rostopchin, S. I., Rachkovskaya, T. M., & Poklad, D. B. 2010, MN- RAS, 402, 1369 Stasińska, G., Szczerba, R., Schmidt, M., & Siódmiak, N.

2006, A&A, 450, 701 Straizys, V., & Kuriliene, G. 1981, Ap&SS, 80, 353 Yoss, K. M. 1961, ApJ, 134, 809