52 CAVICHIA, COSTA, & MACIEL

TABLE 1 GALACTOCENTRIC DISTANCES OF PNE IN THE SAMPLE

PN G Name RSSV 08 (kpc) RZ95 (kpc) PN G Name RSSV 08 (kpc) RZ95 (kpc)

000.1–01.1 M3-43 – 1.81 009.4–09.8 M3-32 1.85 1.57 000.2–01.9 M2-19 −0.30 0.63 009.6–10.6 M3-33 −1.45 – 000.3–04.6 M2-28 – −0.70 009.8–04.6 H1-67 0.64 0.80 000.4–02.9 M3-19 0.31 −0.73 010.4+04.5 M2-17 – 0.85 000.7–02.7 M2-21 −2.20 – 010.7–06.4 IC4732 1.51 3.22 000.7–03.7 M3-22 0.50 −0.63 010.7–06.7 Pe1-13 −1.37 – 000.7+03.2 Hen 2-250 – 1.07 010.7+07.4* Sa2-230 1.41 – 000.9–04.8 M3-23 3.78 3.45 010.8–01.8 NGC 6578 4.42 – 001.0+01.9 K1-4 6.06 – 011.0+05.8 NGC 6439 1.89 – 001.2–03.0 H1-47 – −2.07 350.5–05.0* H1-28 −1.93 – 001.2+02.1 Hen 2-262 −1.57 1.39 350.9+04.4 H2-1 2.45 – 001.4+05.3 H1-15 −1.29 0.73 351.1+04.8 M1-19 −2.75 0.71 001.7–04.6 H1-56 – −3.06 351.2+05.2 M2-5 – 0.80 001.7+05.7 H1-14 1.73 2.24 351.6–06.2* H1-37 −1.81 – 002.0–02.0* H1-45 −7.12 −0.36 352.0–04.6 H1-30 – 2.88 002.0–06.2 M2-33 −1.09 −1.02 352.1+05.1 M2-8 −1.39 1.05 002.1–02.2 M3-20 0.44 2.71 352.6+03.0 H1-8 −0.91 – 002.1–04.2 H1-54 −4.39 −0.57 353.7+06.3 M2-7 1.19 −1.00 002.2–02.7 M2-23 3.75 −0.51 354.2+04.3 M2-10 – −2.73 002.2–09.4 Cn1-5 2.83 3.70 355.1–02.9 H1-31 – −3.78 002.4+05.8 NGC 6369 6.92 – 355.1–06.9 M3-21 – 2.55 002.6–03.4 M1-37 – −0.62 355.4–02.4 M3-14 2.33 1.58 002.6+08.1 H1-11 1.19 1.30 355.4–04.0 Hf2-1 1.92 – 002.7–04.8 M1-42 2.53 3.15 355.7–03.0 H1-33 −4.05 −1.23 002.7+01.6 H2-20 – 0.53 355.7–03.4* H1-35 2.15 2.03 002.8–02.2 Pe2-12 – −4.12 355.9–04.2 M1-30 – 2.18 003.1+02.9 Hb4 2.98 – 355.9+03.6* H1-9 2.19 – 003.1+03.4 H2-17 – −0.98 356.2–04.4 Cn2-1 −0.56 1.91 003.2–06.1 M2-36 2.03 1.29 356.3–06.2* M3-49 −5.33 – 003.3–04.6 Ap1-12 3.42 – 356.5–02.3 M1-27 3.41 4.27 003.4–04.8 H2-43 – 3.03 356.5–03.9 H1-39 −7.28 −2.08 003.5–04.6 NGC 6565 3.37 3.68 356.7–04.8 H1-41 2.37 1.51 003.6–02.3 M2-26 −0.40 −1.46 356.8–05.4* H2-35 1.86 – 003.7–04.6 M2-30 −1.55 −0.68 356.9–05.8 M2-24 −1.52 −3.86 003.8–04.3 H1-59 −1.53 −3.18 356.9+04.4 M3-38 −6.07 −0.65 003.8–04.5 H2-41 −0.85 −6.23 356.9+04.5 M2-11 – 1.08 003.8+05.3 H2-15 −7.40 −8.96 357.1–04.7 H1-43 −5.33 −3.59 003.9–02.3 M1-35 1.93 3.38 357.1+03.6 M3-7 1.73 2.62 004.0–03.0 M2-29 −0.75 −2.01 357.2–04.5 H1-42 1.94 3.22 004.0–05.8 Pe1-12 1.66 −2.33 357.2+07.4 M4-3 – −0.37 004.1–04.3 H1-60 −2.24 −0.82 357.3+03.3 M3-41 – 3.87 004.6+06.0 H1-24 – 0.89 357.3+04.0 H2-7 – −1.32 004.8–05.0 M3-26 0.82 −0.82 357.4–03.2 M2-16 1.05 2.18 004.8+02.0 H2-25 −3.45 −4.22 357.4–03.5 M2-18 −7.74 −1.48 004.9+04.9 M1-25 1.50 3.11 357.4–04.6 M2-22 −0.79 −1.97 005.0+04.4 H1-27 0.65 −2.94 357.5+03.2 M3-42 1.17 −1.78 005.2+05.6 M3-12 – 1.24 357.6+01.7 H1-23 −1.74 1.89 005.5–02.5* M3-24 1.34 – 357.6+02.6 H1-18 – 0.72 005.7–05.3 M2-38 1.24 −1.01 357.9–05.1 M1-34 – 2.15 005.8–06.1 NGC 6620 −1.19 1.61 358.2+03.5 H2-10 −5.35 −0.50 005.8+05.1 H2-16 2.81 – 358.2+03.6 M3-10 −1.40 1.72 006.0–03.6 M2-31 – 3.14 358.2+04.2 M3-8 0.96 0.78 006.1+08.3* M1-20 −1.12 2.34 358.3–02.5 M4-7 1.66 2.81 006.4–04.6* Pe2-13 1.92 – 358.3+03.0* H1-17 0.42 −0.59 006.4+02.0 M1-31 2.94 4.10 358.5–04.2* H1-46 −0.75 1.04 006.8–03.4* H2-45 1.89 – 358.6+01.8 M4-6 – 1.76 006.8+04.1 M3-15 – 3.94 358.6+07.8 M3-36 – −6.05 007.0–06.8 VY2-1 0.86 2.57 358.7–05.2* H1-50 −3.03 0.79 007.0+06.3* M1-24 −1.00 – 358.8+03.0 Th3-26 0.66 – 007.1–06.0 H1-66 – −1.70 358.9+03.2 H1-20 0.64 2.91 007.2+01.8* Hb6 3.78 – 358.9+03.3* H1-19 −2.95 −0.51 007.5+07.4 M1-22 – −4.02 359.1–01.7 M1-29 – 4.70 007.8–04.4 H1-65 – −2.25 359.1–02.3 M3-16 1.30 1.50 008.0+03.9 NGC 6445 6.64 – 359.3–03.1 M3-17 −3.60 −1.10 008.1–04.7 M2-39 −4.02 −2.21 359.4–03.4 H2-33 0.54 −1.78 008.2–04.8 M2-42 −1.48 0.66 359.7–02.6 H1-40 0.84 0.36 008.2+06.8* Hen 2-260 −12.23 −3.62 359.8+03.7 Th3-25 -6.52 – 008.3–07.3* NGC 6644 2.18 4.01 359.8+06.9 M3-37 −8.69 −5.50 009.0+04.1 Th4-5 – 1.69 359.9–04.5 M2-27 −4.45 2.68 009.4–05.0 NGC 6629 5.67 – 359.9+05.1 M3-9 4.70 –