UBVR POLARIMETRY OF CARBON STARS 67

TABLE 2 (CONTINUED)

Name JD (2450000.00+) Filter Magnitude Dif (%) p ± ϵ_p (%) θ ± ϵ_θ (deg)

T Dra 4913.93 B 13.86±0.01 0.71 4.4±0.1 95±3 V 9.67±0.01 0.41 2.6±0.1 106±1 R 7.94±0.01 0.18 2.3±0.1 104±1 4951.88 U 16.17±0.02 1.91 5.7±0.7 113±3 B 13.21±0.08 0.09 4.0±0.2 112±1 V 9.24±0.01 0.02 3.5±0.1 100±1 R 7.59±0.01 0.36 2.4±0.1 104±1 5000.77 U 16.21±0.02 0.27 2.3±0.7 102±7 B 13.30±0.01 0.40 6.1±0.1 116±3 V 9.40±0.01 0.01 3.5±0.1 108±1 R 7.64±0.01 0.27 3.2±0.1 103±1 5039.72 U 16.33±0.03 0.29 8.2±0.8 114±1 B 13.76±0.01 0.59 6.5±0.2 116±1 V 9.78±0.01 0.16 3.8±0.1 117±1 R 7.91±0.01 0.02 2.7±0.1 108±1 5067.69 U 16.59±0.04 1.05 7.2±0.8 100±2 B 14.17±0.02 0.12 4.2±0.2 113±3 V 10.19±0.01 0.17 3.6±0.1 114±1 R 8.11±0.01 0.09 2.4±0.1 109±1

RV Aqr 5000.97 V 11.65±0.01 0.05 7.41±0.31 106±1 R 9.41±0.01 0.16 5.18±0.18 114±1 5038.87 B 16.94±0.01 0.75 8.22±0.49 107±1 V 12.13±0.01 0.17 7.81±0.19 111±1 R 9.73±0.01 0.12 6.22±0.12 113±1 5096.64 B 17.51±0.02 0.68 7.68±0.49 115±1 V 12.45±0.02 0.02 7.36±0.16 114±1 R 9.90±0.02 0.16 6.22±0.11 120±1 5126.63 B 16.98±0.02 0.07 5.67±0.45 120±2 V 12.11±0.01 0.15 6.66±0.19 117±1 R 9.75±0.01 0.51 6.47±0.12 121±1

RT Cap 5003.9 U 14.06±0.02 1.60 4.14±0.48 106±2 B 10.80±0.01 0.43 1.23±0.13 107±2 V 6.93±0.01 0.01 2.24±0.09 88±1 R 5.27±0.01 0.54 2.69±0.08 107±1 5038.85 U 13.89±0.03 0.29 3.61±0.40 105±2 B 10.40±0.01 0.07 1.47±0.13 100±2 V 6.78±0.01 0.37 1.11±0.10 135±2 R 5.11±0.01 2.19 3.64±0.13 102±1 5067.76 U 14.17±0.03 0.09 9.90±0.36 91±1 B 10.63±0.02 0.04 1.84±0.12 89±1 V 7.05±0.01 0.40 1.04±0.11 107±2 R 5.22±0.01 0.13 1.81±0.13 92±1 5095.63 U 14.55±0.03 2.15 5.40±0.32 112±1 B 11.07±0.02 0.13 0.46±0.11 134±5 V 7.07±0.02 0.11 1.13±0.09 109±2 R 5.55±0.02 0.49 1.74±0.12 77±1 5127.58 U 14.34±0.02 0.32 5.14±0.43 105±2 B 11.33±0.01 0.22 1.74±0.17 98±2 V 7.61±0.01 0.24 1.85±0.10 92±1 R 5.63±0.01 0.65 1.61±0.10 78±1

3.1. V Hya Figure 1 shows the polarization and position angle of V Hya in the UBVR bands. This star was observed only once at JD=2454951.64. Spectropolarimetry of V Hya was performed by Trammell et al. (1994) in the range of λλ5000 − 7000, who obtained an average polarization of 3.01 ± 0.01 and 10.06 ± 0.05% at position angles of 124 ± 1^∘ and 94±1^∘ for April 1992 and January 1993, respectively.

The ranges of these values are in agreement with the ones presented in this work. Kruszewski, Gehrels, & Serkowski (1968) report polarization in the B filter of 2.73 to 3.17% over a span of 169 days, while the polarization in the yellow filter varied from 1.78 to 2.25% over the same period of time. Serkowski & Shawl (2001) obtain values of the degree of polarization in the following ranges for each filter: U = (1.52 to 1.66)% during 76 days; B = (1.31, 3.14)%