86 PHILLIPS & MÁRQUEZ-LUGO

TABLE 1 GALACTIC PNE IDENTIFIED IN THE AKARI IRC CATALOGUE

KN NAME R.A. (2000) DEC (2000) F (9 μm) F (18 μm) θ MN 18 F(1.4 GHz) F(5 GHz) DIST DIAM

H:M:S D:M:S Jy Jy arcsec arcsec mJy mJy kpc pc

4 010.2+02.7 17 58 14.415 −18 41 26.15 – 0.844 – 3.53 18.3 – – – 5 021.9+02.7 18 21 21.115 −08 31 42.30 0.285 4.516 – 4.12 36.2 – – – 6 050.6+19.7 18 08 20.083 +24 10 43.26 2.483 13.329 – 4.8 – – – – 7 099.3−01.9 22 04 12.301 +53 04 01.36 0.46 11.917 – 4.74 – – – – 9 19W32 17 39 02.870 −28 56 35.10 – 6.588 24 4.46 13.5 21.3 – – 10 341.4−09.0 17 35 02.502 −49 26 26.38 5.541 77.831 – 6.67 – – – – 27 A 30 08 46 53.514 +17 52 45.47 0.548 18.039 4.47 6.04 – 2.3 2.55 0.055 31 A 35 12 53 32.792 −22 52 22.57 0.114 – 772 – – 255 0.74 2.77 42 A 47 18 35 22.569 −00 13 49.68 – 0.143 17 2.13 7.3 – – – 43 A 48 18 42 46.908 −03 13 17.30 – 3.342 40 6.97 159.4 – – – 48 A 53 19 06 45.910 +06 23 52.47 – 1.043 31 5.16 33.6 85.7 1.68 0.252 53 A 58 19 18 20.476 +01 46 59.62 2.846 15.29 – 4.95 – – – – 73 A 78 21 35 29.410 +31 41 45.39 0.986 30.5 107 7.23 3.7 4.9 2.22 1.152 83 Al 2-E 17 30 14.398 −27 30 19.41 – 0.873 – 3.44 14.7 – – – 85 Al 2-G 17 32 22.670 −28 14 27.32 – 1.013 – 3.39 – – – – 90 Al 2-0 17 51 44.663 −31 36 00.18 – 0.775 5.7 3.18 38 33 – – 92 Al 2-R 17 53 36.431 −31 25 25.19 – 0.306 – 3.17 – – – – 94 Ap 1-12 18 11 35.088 −28 22 37.02 0.207 3.286 12 4.03 6.6 18.7 5.34 0.311 96 BD+30 3639 19 34 45.235 +30 30 58.94 47.546 148.573 7.6 7.65 235.2 630 – – 102 Bl 2-1 22 20 16.638 +58 14 16.59 1.554 4.116 1.6 3.99 21.6 54 6.94 0.054 103 Bl 3-10 17 55 20.537 −29 57 36.13 – 0.357 – 3.01 4.7 – – – 104 Bl 3-13 17 56 02.759 −29 11 16.21 – 0.809 – 3.31 4.7 10 – – 105 Bl 3-15 17 52 35.947 −29 06 38.97 – 0.372 – 2.67 – – – – 106 Bl B 17 36 59.836 −29 40 08.93 – 1.641 – 3.65 8.9 – – – 108 Bl M 17 53 47.180 −28 27 16.88 – 1.249 4.5 3.61 9.3 17 7.03 0.153 109 Bl O 17 53 49.717 −28 59 11.26 0.149 1.534 – 3.7 3.6 – – – 110 Bl Q 17 54 34.866 −28 12 43.04 0.195 1.65 – 3.76 18.2 – – – 112 CRBB 1 20 19 28.702 −41 31 27.46 – 0.647 – 3.37 – – – – 113 CRL 618 04 42 53.672 +36 06 53.17 189.266 – 12 – 4 67 2.72 0.158 119 Cn 1-1 15 51 15.936 −48 44 58.67 13.024 27.81 – 5.27 – 10 – – 120 Cn 1-3 17 26 12.392 −44 11 24.52 0.525 – – – – – – – 122 Cn 1-5 18 29 11.653 −31 29 59.21 – 4.672 7 4.16 51 44 4.43 0.15 123 Cn 2-1 17 54 32.978 −34 22 20.84 – 3.665 2.2 3.84 25.2 49 6.17 0.066 124 Cn 3-1 18 17 34.133 +10 09 03.99 0.239 6.365 4.5 4.33 59.5 75 4 0.087 126 DdDm 1 16 40 18.156 +38 42 19.92 – 0.233 1 2.69 5.7 6 15.85 0.077 150 Fg 1 11 28 36.205 −52 56 04.01 0.416 0.92 16 5.32 – 55 2.02 0.157 151 Fg 2 17 39 19.847 −44 09 37.14 0.227 1.226 – 3.66 – – – – 152 Fg 3 18 00 11.819 −38 49 52.73 1.441 16.842 2 5.1 42 107 – – 154 G001.1+00.8 17 45 11.085 −27 32 38.00 1.182 4.009 – 4.48 73 – – – 155 G001.5−00.7 17 52 08.717 −28 02 16.56 0.394 3.804 – 4.32 17.2 – – – 158 G002.5+05.1 17 32 12.788 −24 04 59.56 1.138 9.218 – 4.56 – – – – 163 G009.3+05.7 17 45 14.155 −17 56 46.57 – 13.562 – 4.75 – – – – 164 G010.2+07.5 17 41 00.035 −16 18 12.50 – 3.076 – 3.83 – – – – 165 G011.1−07.9 18 40 19.914 −22 54 29.23 – 2.813 – 3.75 – – – – 168 G013.1−13.2 19 04 43.548 −23 26 08.82 7.78 – – – – – – – 170 G014.2+03.8 18 02 38.257 −14 42 03.22 0.421 7.042 – 4.29 – – – – 172 G014.5−36.1 20 42 45.967 +30 04 06.51 3.74 37.172 – 5.88 – – – – 175 G017.0+11.1 17 42 14.430 −08 43 18.61 – 2.126 – 4.32 23.4 – – – 179 G019.2−04.4 18 42 24.770 −14 15 11.81 – 0.495 – 3.76 7.3 – – – 180 G020.4+00.6 18 25 58.081 −10 45 28.49 0.447 5.891 – 4.2 48.7 – – – 182 G032.0−01.7 18 56 15.684 −01 34 00.31 – 0.485 – 2.89 10.7 – – – 184 G033.7−02.0 19 00 16.133 −00 14 32.59 – 0.347 – 2.89 3.5 – – – 185 G034.5−11.7 19 36 17.531 −03 53 25.26 0.151 3.996 – 3.98 8.8 – – – 186 G038.4+01.8 18 54 54.139 +05 48 11.29 0.211 2.773 – 3.92 20.5 – – – 188 G039.1−02.2 19 10 53.284 +04 27 28.50 – 0.439 – 3.26 11 – – – 191 G044.1+01.5 19 06 32.146 +10 43 23.93 – 0.815 – 3.24 19.4 – – – 193 G047.2+01.7 19 11 35.828 +13 31 11.58 0.78 3.869 – 4.07 – – – – 195 G051.5+00.2 19 25 40.679 +16 33 05.56 – 3.863 – 4.38 77 – – – 200 G059.4−00.7 19 45 34.244 +22 58 34.41 – 0.958 – 3.35 26.5 – – – 202 G069.2+01.2 20 00 41.998 +32 27 41.23 – 0.516 – 3.6 17 – – – 204 G076.6−05.7 20 48 16.627 +34 27 24.36 0.11 6.21 – 4.27 – – – – 207 G095.0−05.5 21 56 32.945 +47 36 13.40 0.369 1.764 – 3.67 – – – – 219 G199.4+14.3 07 20 01.614 +18 17 26.47 0.147 0.689 – 3.09 – – – – 221 G222.8−04.2 06 54 13.406 −10 45 38.27 0.204 1.727 – 4 2.7 – – – 226 G255.3−03.6 08 06 28.339 −38 53 23.93 0.091 1.275 – 3.56 2.8 – – – 228 G260.1+00.2 08 37 24.599 −40 38 07.46 0.318 2.612 – 4.41 – – – – 229 G270.1−02.9 08 59 02.971 −50 23 39.68 0.262 1.373 – 3.64 – – – – 231 G277.1−01.5 09 37 51.861 −54 27 08.59 0.724 3.141 – 3.94 – – – – 232 G279.1−00.4 09 53 27.058 −54 52 39.60 0.059 0.866 – 3.46 – – – – 234 G282.6−00.4 10 13 19.673 −56 55 32.24 0.313 3.065 – 3.99 – – – – 235 G285.1−02.7 10 19 32.466 −60 13 29.41 3.022 17.044 – 5.16 – – – – 238 G301.1−01.4 12 34 35.968 −64 18 16.99 2.012 17.086 – 5.08 – – – – 241 G308.5−03.5 13 46 25.712 −65 46 24.26 0.176 2.768 – 3.93 – – – – 243 G313.1+02.1 14 16 51.803 −58 53 10.01 0.136 1.979 – 3.72 – – – – 244 G313.3+01.1 14 15 53.284 −60 01 37.31 0.948 9.663 – 4.49 – – – – 245 G314.4+02.2 14 21 19.909 −58 38 22.10 0.543 5.337 – 4.08 – – – – 246 G316.2+00.8 14 38 19.980 −59 11 46.12 1.053 10.213 – 4.51 – – – – 251 G328.4−02.8 16 09 20.143 −55 36 09.84 0.301 2.054 – 3.85 – – – – 253 G331.3−12.1 17 16 21.107 −59 29 23.35 0.089 2.566 – 3.9 – – – – 254 G336.1+04.1 16 15 02.803 −45 11 54.10 0.314 2.13 – 3.98 – – – – 255 G340.3−03.2 17 03 10.027 −47 00 27.68 18.997 158.829 – 7.92 – – – – 259 G342.2−00.3 16 56 33.989 −43 46 13.55 0.793 9.718 – 4.45 – – – – 261 G343.7−09.6 17 45 33.415 −47 43 50.31 2.362 2.236 – 3.78 – – – –