MID- AND FAR-INFRARED PHOTOMETRY OF GALACTIC PNE 87

TABLE 1 (CONTINUED)

KN NAME R.A. (2000) DEC (2000) F (9 μm) F (18 μm) θ MN 18 F(1.4 GHz) F(5 GHz) DIST DIAM

H:M:S D:M:S Jy Jy arcsec arcsec mJy mJy kpc pc

263 G344.9−01.9 17 12 22.022 −42 30 41.24 0.487 9.329 – 4.58 – – – – 264 G347.9−06.0 17 40 03.329 −42 24 05.58 – 0.202 – 3.04 – – – – 267 G351.5−06.5 17 52 09.386 −39 32 14.52 – 0.229 – 2.45 – – – – 273 G353.4−02.4 17 39 17.147 −35 46 58.88 0.248 – – – – – – – 276 G353.8−01.2 17 35 27.372 −34 47 42.22 – 0.474 – 2.83 8.2 – – – 286 G355.4+02.3 17 25 03.470 −31 28 38.50 – 0.533 – 3.2 10.4 – – – 287 G355.4−01.4 17 40 00.347 −33 35 32.29 – 0.34 – 3 8.7 – – – 294 G356.8−03.0 17 50 10.734 −33 14 17.97 – 0.436 – 3.03 4.2 – – – 295 G357.1+01.2 17 33 50.871 −30 42 36.75 0.206 0.967 – 3.38 11.3 – – – 300 G358.4+01.6 17 35 22.745 −29 22 17.40 – 0.452 – 2.91 5.5 – – – 301 G358.6−02.4 17 52 00.342 −31 17 49.92 – 0.665 – 3.37 12 – – – 308 G359.8+08.9 17 11 38.912 −24 07 32.87 0.755 6.889 – 4.13 – – – – 310 G000.5+01.9 17 39 31.219 −27 27 46.77 – 0.53 – 3.11 6.8 – – – 316 G001.5+03.6 17 35 22.074 −25 42 46.48 – 0.934 – 3.45 12.2 – – – 318 G001.6+01.5 17 43 16.950 −26 44 17.54 – 0.539 – 3.14 9.8 – – – 326 G003.6+04.9 17 35 31.198 −23 11 47.62 – 0.213 – 2.57 4.6 – – – 333 G070.9+02.2 20 00 52.927 +34 28 22.18 0.153 3.084 – 4.04 – – – – 335 G000.1−01.2 17 50 24.297 −29 25 18.70 – 2.05 – 3.64 – – – – 339 G000.2−01.4 17 51 53.546 −29 30 53.18 3.23 3.541 – 3.75 – – – – 340 G000.4+01.1 17 42 25.108 −27 55 35.95 – 1.157 – 4.13 23.6 – – – 341 G000.6−01.0 17 51 11.504 −28 56 26.16 0.493 – – – – – – – 345 G000.0+02.0 17 37 42.929 −27 49 09.55 – 1.557 – 3.61 6.2 – – 359 H 1-11 17 21 17.693 −22 18 35.32 – 1.044 6 3.59 20.7 13 7.27 0.211 360 H 1-12 17 26 24.239 −35 01 41.26 – 30.05 <25 6.4 372 719 1.4 – 361 H 1-13 17 28 27.537 −35 07 31.63 – 27.492 14 6.16 474 620 1.39 0.094 363 H 1-15 17 28 37.616 −24 51 06.60 – 1.414 4.3 3.88 13.6 13 7.9 0.165 364 H 1-16 17 29 23.358 −26 26 04.39 0.272 – 2 – 34.7 58 – – 366 H 1-18 17 29 42.759 −29 32 50.21 0.336 2.667 1.5 3.81 17.6 33 7.37 0.054 368 H 1-2 16 48 54.091 −35 47 09.01 2.425 15.806 1 4.94 14.3 62 – – 369 H 1-20 17 30 43.799 −28 04 06.68 – 1.924 3.3 3.72 26.9 44 5.12 0.082 371 H 1-22 17 32 22.138 −37 57 23.81 – 1.517 <25 3.6 18.4 – – – 373 H 1-24 17 33 37.565 −21 46 24.78 – 1.172 5 3.67 5.1 15 7.32 0.177 374 H 1-26 17 36 29.743 −39 21 56.95 0.385 2.345 <25 5.18 67.1 – – – 375 H 1-27 17 40 17.926 −22 19 17.64 – 2.859 5.2 3.88 – 18 10.9 0.275 377 H 1-29 17 44 13.819 −34 17 33.05 0.174 – <10 – 10.6 – – – 379 H 1-30 17 45 06.782 −38 08 49.48 – 0.556 <5 2.97 7 81 5.21 – 381 H 1-32 17 46 06.291 −34 03 46.25 0.266 – 1.1 – 3.4 37 9.09 0.048 382 H 1-33 17 47 49.387 −34 08 05.44 – 0.958 <10 3.5 15.8 12 – – 383 H 1-34 17 48 07.572 −22 46 47.33 0.352 – 2 – – 13 – – 384 H 1-35 17 49 13.940 −34 22 52.96 1.709 19.148 2 4.86 18.4 72 6.03 0.058 385 H 1-36 17 49 48.172 −37 01 29.47 – 20.615 0.8 5.25 11.8 50 – – 386 H 1-37 17 50 44.569 −39 17 25.98 – 0.508 – 3.56 8.5 – – – 388 H 1-39 17 53 21.003 −33 55 58.42 – 1.308 1.7 3.62 10.8 13 10.04 0.083 390 H 1-40 17 55 36.049 −30 33 32.08 1.255 10.494 3 4.48 8.1 31 7.84 0.114 391 H 1-41 17 57 19.145 −34 09 49.12 – 0.557 9.6 3.33 16.6 12 6.6 0.307 392 H 1-42 17 57 25.169 −33 35 42.94 – 1.769 5.8 3.77 34.5 40 4.82 0.136 393 H 1-43 17 58 14.430 −33 47 37.51 0.309 3.571 3 4.03 4 6 11.56 0.168 394 H 1-44 17 58 10.641 −31 42 56.08 – 0.484 <5 2.98 8 – – – 395 H 1-45 17 58 21.865 −28 14 52.20 5.23 2.443 <10 3.94 – 23.5 8.2 – 396 H 1-46 17 59 02.490 −32 21 43.42 0.303 3.205 1.2 3.94 18.3 43 7.11 0.041 397 H 1-47 18 00 37.596 −29 21 50.22 0.137 2.257 2.5 3.88 8.1 10 10.01 0.121 398 H 1-5 16 57 23.740 −41 37 57.88 1.631 – – – – – – – 399 H 1-50 18 03 53.461 −32 41 42.15 0.189 2.078 1.4 3.69 19.6 31 7.68 0.052 402 H 1-53 18 05 57.404 −26 29 41.50 – 0.651 <25 3.15 7.2 – – – 403 H 1-54 18 07 07.239 −29 13 06.35 0.192 3.092 2.5 3.87 12.7 31 8.01 0.097 404 H 1-55 18 07 14.542 −29 41 24.51 0.176 0.518 10 3.06 2.5 5.3 – – 405 H 1-56 18 07 53.880 −29 44 34.26 – 0.894 3 3.37 8.3 7.8 10.98 0.16 407 H 1-58 18 09 13.835 −26 02 28.78 0.638 5.951 – 4.24 2.7 – – – 408 H 1-59 18 11 29.263 −27 46 15.69 – 0.317 6 2.99 3.4 4.2 11.12 0.323 410 H 1-60 18 12 25.155 −27 29 12.96 – 0.411 3.46 2.73 – 11.3 8.59 0.144 411 H 1-61 18 12 33.977 −24 50 00.28 0.427 – <25 – 4.7 – – – 412 H 1-62 18 13 17.951 −32 19 42.74 0.123 1.979 – 3.78 11.9 – – – 413 H 1-63 18 16 19.336 −30 07 35.98 0.578 4.882 – 4.02 2.5 9 – – 414 H 1-64 18 18 23.908 −23 24 57.15 – 0.297 <25 2.71 8.1 – – – 415 H 1-65 18 20 08.847 −24 15 05.09 0.195 2.52 2.5 3.75 5.9 10 10.23 0.124 416 H 1-66 18 24 57.539 −25 41 55.76 – 0.419 <10 3.53 10.4 6 9.5 – 417 H 1-67 18 25 04.976 −22 34 52.64 0.1 – 6 – 12.2 11.9 7.51 0.218 418 H 1-7 17 10 27.389 −41 52 49.42 1.893 13.029 – 4.72 – – – – 419 H 1-8 17 14 42.902 −33 24 47.21 0.292 2.295 3.4 3.99 22.2 – – – 421 H 2-1 17 04 36.257 −33 59 18.75 0.967 8.184 2.4 4.23 51.5 61 5.84 0.068 422 H 2-10 17 27 32.848 −28 31 06.90 – 1.045 2 3.44 13.4 20 8.21 0.08 423 H 2-11 17 29 25.947 −25 49 06.64 0.248 – 1.5 – 11.5 27.7 – – 425 H 2-13 17 31 08.084 −30 10 28.00 – 1.052 – 3.38 17.2 – – – 426 H 2-14 17 32 20.093 −39 51 25.60 – 0.326 15 3.7 5.2 4.9 – – 430 H 2-18 17 43 28.751 −21 09 51.29 – 0.428 3.5 3.26 10.1 11 – – 431 H 2-20 17 45 39.767 −25 40 00.04 – 1.474 3.5 3.66 13.1 16.3 7.5 0.127 432 H 2-22 17 47 33.926 −21 47 23.11 – 0.236 <8 2.3 5.4 – – – 433 H 2-23 17 48 57.994 −34 21 53.28 – 0.269 – 2.48 5.3 – – – 434 H 2-24 17 48 36.494 −24 16 34.26 – 3.535 4.9 4 4.5 13 7.77 0.185 437 H 2-27 17 51 50.576 −33 47 35.59 0.098 0.541 – 3 7.9 – – – 440 H 2-31 17 56 02.350 −28 14 11.36 – 0.877 – 3.37 5.3 – – – 442 H 2-33 17 58 12.535 −31 08 05.99 – 0.393 8 3.25 8.1 5 9.71 0.377 446 H 2-39 18 08 05.759 −28 26 10.50 – 0.208 – 2.43 4.9 – – – 450 H 2-43 18 12 47.953 −28 19 59.67 0.802 0.702 9 3.28 – 26.4 5.03 0.219 452 H 2-45 18 14 28.844 −24 43 38.35 – 0.317 4.447 2.82 13.2 – – – 454 H 2-48 18 46 35.149 −23 26 48.24 0.65 9.835 2 4.26 31.6 66 6.23 0.06