88 PHILLIPS & MÁRQUEZ-LUGO

TABLE 1 (CONTINUED)

KN NAME R.A. (2000) DEC (2000) F (9 μm) F (18 μm) θ MN 18 F(1.4 GHz) F(5 GHz) DIST DIAM

H:M:S D:M:S Jy Jy arcsec arcsec mJy mJy kpc pc

455 H 2-7 17 23 24.936 −28 59 06.05 – 0.702 4.2 3.47 11.3 9 9.18 0.187 457 H 3-29 04 37 23.484 +25 02 40.94 0.087 0.711 21 4.06 18.3 18 3.4 0.346 462 HaTr 11 19 02 59.373 +03 02 20.77 – 0.566 – 3.74 17 83 – – 465 HaTr 2 15 30 18.542 −61 01 38.79 – 0.199 – 2.95 – – – – 474 Hb 12 23 26 14.814 +58 10 54.65 11.885 40.599 0.8 6.06 – 45 10.46 0.041 476 Hb 5 17 47 56.187 −29 59 41.91 – 41.232 3.4 6.43 179.5 548 1.32 0.022 477 Hb 6 17 55 07.023 −21 44 39.98 1.144 – 6 – 190.5 243 2.45 0.071 478 Hb 7 18 55 37.950 −32 15 47.07 0.161 2.143 4 3.78 25.4 30 5.9 0.114 479 He 1-1 19 23 46.875 +21 06 38.60 – 0.611 8 3.4 16 14 – – 480 He 1-2 19 26 37.757 +21 09 27.04 0.125 2.281 4.7 4.01 14.6 15 – – 481 He 1-3 19 48 26.422 +22 08 37.62 0.12 – 8 – 53.5 – – – 483 He 1-5 20 11 56.057 +20 20 04.43 14.057 5.46 36 4.07 4.8 5.2 6.71 1.171 485 He 2-101 13 54 55.721 −58 27 16.46 1.096 1.054 <10 3.55 – – – – 486 He 2-102 13 58 13.866 −58 54 31.78 0.215 1.276 9 4.09 – 33 3.77 0.164 487 He 2-104 14 11 52.077 −51 26 24.18 7.077 7.358 5 4.24 – 15 – – 489 He 2-107 14 18 43.339 −63 07 09.48 0.155 4.631 10 4.49 – 65 2.97 0.144 490 He 2-108 14 18 08.889 −52 10 39.76 0.179 4.04 11 4.76 – 32 3.49 0.186 494 He 2-112 14 40 30.924 −52 34 56.66 0.271 3.3 14.6 3.93 – 82 2.36 0.167 495 He 2-113 14 59 53.523 −54 18 07.20 62.991 209.197 – 7.79 – 115 – – 499 He 2-117 15 05 59.193 −55 59 16.53 1.558 20.941 5 5.32 – 267 2.69 0.065 500 He 2-118 15 06 13.731 −42 59 56.46 – 0.87 5 3.5 – 10 – – 502 He 2-120 15 11 56.388 −55 39 46.67 – 0.567 27 4.07 – 26 2.51 0.329 503 He 2-123 15 22 19.360 −54 08 12.77 0.419 2.327 4.6 3.88 – 110 3.59 0.08 504 He 2-125 15 23 36.326 −53 51 27.95 0.109 1.87 3 3.84 – 20.4 6.96 0.101 505 He 2-128 15 25 07.841 −51 19 42.29 0.201 2.529 5 3.86 – 40 – – 506 He 2-129 15 25 32.677 −52 50 37.96 0.143 1.474 1.6 3.59 – 35 7.85 0.061 507 He 2-131 15 37 11.210 −71 54 52.89 2.586 50.505 6 6.43 – 325 2.2 0.064 508 He 2-132 15 38 01.182 −58 44 42.07 0.232 1.382 17.8 4.82 – 25 3.02 0.261 509 He 2-133 15 41 58.788 −56 36 25.72 1.254 16.766 <10 5.03 – 210 3.18 – 510 He 2-136 15 52 10.666 −62 30 46.94 0.137 0.588 10 3.14 – 23 – – 511 He 2-138 15 56 01.694 −66 09 09.23 1.015 21.099 7 5.5 – 76 3.61 0.123 512 He 2-140 15 58 08.063 −55 41 50.13 0.309 6.339 2.6 4.32 – 80 5.03 0.063 513 He 2-141 15 59 08.762 −58 23 53.15 0.151 1.255 13.8 4.26 – 51 2.77 0.185 514 He 2-142 15 59 57.608 −55 55 32.89 4.033 15.811 3.6 4.89 – 65 4.75 0.083 515 He 2-143 16 00 59.125 −55 05 39.74 0.854 8.233 5.2 4.34 – 120 3.32 0.084 516 He 2-145 16 08 58.902 −51 01 57.74 – 0.713 <25 5.98 – – – – 518 He 2-147 16 14 01.045 −56 59 27.78 5.208 2.678 – 3.65 – – – – 519 He 2-149 16 14 24.266 −54 47 38.82 – 0.542 3 2.96 – 10 8.52 0.124 520 He 2-15 08 53 30.701 −40 03 42.08 0.227 1.209 23.8 4.64 94.5 105 1.92 0.222 521 He 2-151 16 15 42.269 −59 54 00.96 0.616 12.148 5 4.62 – 10 – – 522 He 2-152 16 15 20.031 −49 13 20.76 1.234 7.995 11 4.64 – 196 2.09 0.111 524 He 2-155 16 19 23.101 −42 15 35.98 0.223 0.721 14.6 3.72 – 70 2.47 0.175 525 He 2-157 16 22 14.264 −53 40 54.09 – 1.951 <5 3.89 – 30 6.24 – 526 He 2-158 16 23 30.605 −58 19 22.64 – 0.455 2 3.37 – 2.7 14.71 0.143 527 He 2-159 16 24 21.417 −54 36 02.82 – 0.303 10 2.52 – 25 3.9 0.189 528 He 2-161 16 24 37.786 −53 22 34.14 0.113 0.717 10 3.43 – 32 3.64 0.176 529 He 2-162 16 27 50.914 −54 01 28.36 0.25 0.927 <5 3.78 – 28 – – 531 He 2-164 16 29 53.255 −53 23 15.37 0.226 1.529 16 4.6 – 97 2.17 0.168 533 He 2-169 16 34 13.328 −49 21 13.20 0.338 1.699 21.8 4.6 – 128 2.7 0.285 534 He 2-170 16 35 21.170 −53 50 11.11 0.16 1.675 5 3.8 – 15 – – 535 He 2-171 16 34 04.240 −35 05 26.93 4.775 3.186 10 3.75 – 10 – – 536 He 2-175 16 39 28.112 −36 34 16.41 0.183 – 6.6 – 19.2 26.8 4.58 0.147 538 He 2-182 16 54 35.167 −64 14 28.43 0.365 4.408 10 4.21 – 62 – – 539 He 2-185 17 01 17.254 −70 06 03.35 – 0.506 10 3.17 – 18 – – 540 He 2-186 16 59 36.064 −51 42 06.46 0.091 0.752 3 3.44 – 21 6.9 0.1 541 He 2-187 17 01 36.976 −50 22 57.49 – 0.549 6 3.65 – – – – 543 He 2-21 09 13 52.823 −55 28 16.80 – 0.237 <10 2.46 – 16 8.21 – 545 He 2-25 09 18 01.308 −54 39 29.01 1.781 3.827 4.4 3.95 – 827.9 2.07 0.044 546 He 2-250 17 34 54.710 −26 35 56.92 – 0.728 5 3.4 15.3 15 7.01 0.17 547 He 2-26 09 19 27.476 −59 12 00.39 0.171 1.109 <10 3.54 – 40 1.91 – 548 He 2-262 17 40 12.814 −26 44 21.37 – 1.082 <10 3.46 24.1 26 6.64 – 549 He 2-28 09 22 06.825 −54 09 38.60 – 0.123 10 1.95 – 20 4.15 0.201 550 He 2-29 09 24 45.834 −54 36 15.45 – 0.326 14 3.07 – 24 3.41 0.231 551 He 2-306 17 56 33.706 −43 03 18.90 – 0.83 – 3.32 – – – – 553 He 2-34 09 41 13.997 −49 22 47.18 8.941 6.16 <10 4.19 – – – – 554 He 2-35 09 41 37.504 −49 57 58.71 – 1.009 5 3.61 – 20 5.61 0.136 555 He 2-36 09 43 25.538 −57 16 55.44 0.192 1.686 22 4.25 – 90 3.1 0.331 559 He 2-41 10 07 23.611 −63 54 30.06 – 0.393 <10 2.94 – 41 3.39 – 561 He 2-428 19 13 05.239 +15 46 39.80 – 0.331 8 2.99 26.7 7 6.16 0.239 562 He 2-429 19 13 38.422 +14 59 19.21 0.271 2.24 4.2 3.96 58.5 64.9 4.33 0.088 563 He 2-430 19 14 04.197 +17 31 32.92 0.255 – 1.7 – 18.2 40 7.36 0.061 564 He 2-432 19 23 24.821 +21 08 00.50 0.152 1.286 2.3 3.61 21.3 32 6.88 0.077 565 He 2-434 19 33 49.420 −74 32 58.66 – 1.035 10 3.42 – – – – 566 He 2-436 19 32 06.701 −34 12 57.43 0.327 0.457 10 2.86 – 23 – – 567 He 2-437 19 32 57.657 +26 52 43.35 2.839 5.478 – 4.11 6.6 – – – 568 He 2-440 19 38 08.403 +25 15 40.98 0.233 2.995 2.2 3.98 26.4 43 6.45 0.069 569 He 2-442 19 39 43.376 +26 29 33.05 14.02 7.485 <10 4.24 – 6 – – 570 He 2-447 19 45 22.164 +21 20 04.03 0.951 6.286 1.2 4.21 22.9 60 7.63 0.044 571 He 2-459 20 13 57.898 +29 33 55.94 2.042 17.276 1.3 5.12 13.9 64 7.24 0.046 572 He 2-47 10 23 09.143 −60 32 42.21 1.4 22.347 5 5.53 – 170 – – 574 He 2-5 07 47 20.022 −51 15 03.42 0.08 1.011 3 3.51 – 29 6.3 0.092 577 He 2-55 10 48 43.168 −56 03 10.21 – 0.324 <25 3.58 – – – – 579 He 2-62 11 17 43.157 −70 49 32.41 0.075 0.692 <10 3.36 – – – – 582 He 2-67 11 28 47.369 −60 06 37.28 0.224 1.375 5 3.64 – 41 – – 583 He 2-68 11 31 45.427 −65 58 13.67 0.369 2.549 10 3.9 – 34 – – 584 He 2-7 08 11 31.890 −48 43 16.71 0.102 0.596 44.6 3.27 – 47 2.91 0.629