MID- AND FAR-INFRARED PHOTOMETRY OF GALACTIC PNE 89

TABLE 1 (CONTINUED)

KN NAME R.A. (2000) DEC (2000) F (9 μm) F (18 μm) θ MN 18 F(1.4 GHz) F(5 GHz) DIST DIAM

H:M:S D:M:S Jy Jy arcsec arcsec mJy mJy kpc pc

586 He 2-71 11 39 11.198 −68 52 09.14 0.298 3.484 5 3.95 – 12 – – 588 He 2-73 11 48 38.191 −65 08 37.33 0.378 3.875 4 3.99 – 76 4.23 0.082 589 He 2-76 12 08 25.433 −64 12 09.32 – 0.467 – 3.43 – – – – 590 He 2-78 12 09 10.196 −58 42 37.44 – 0.717 – 3.4 – – – – 591 He 2-81 12 23 01.237 −64 01 45.96 – 0.308 <25 2.7 – – – – 593 He 2-83 12 28 43.997 −62 05 35.05 0.357 6.569 – 4.27 – – – – 594 He 2-84 12 28 46.822 −63 44 37.22 – 0.261 – 2.56 – – – – 595 He 2-85 12 30 07.567 −63 53 00.32 0.463 3.29 10.2 4.26 – 111.7 2.53 0.125 596 He 2-86 12 30 30.426 −64 52 05.58 1.102 12.943 3.6 4.81 – 125 3.85 0.067 598 He 2-9 08 28 27.988 −39 23 40.27 0.754 6.989 4.4 4.37 135.6 194.8 3.11 0.066 599 He 2-90 13 09 36.252 −61 19 35.96 32.451 62.806 10 6.59 – 25 – – 600 He 2-96 13 42 36.150 −61 22 29.18 0.762 7.397 – 4.25 – – – – 601 He 2-97 13 45 22.394 −71 28 56.13 0.419 4.989 5 4.03 – 30 – – 602 He 2-99 13 52 30.683 −66 23 26.49 0.366 5.097 17 5.04 – 18 3.4 0.28 603 He 3-1333 17 09 00.932 −56 54 48.25 118.338 165.011 – 7.72 – 26 – – 605 Hf 2-2 18 32 30.935 −28 43 20.47 – 0.3 – 2.31 4.4 – – – 606 Hf 39 10 53 59.586 −60 26 44.31 1.092 8.06 – 10.32 – – – – 607 Hf 48 11 03 55.979 −60 36 04.57 – 0.416 – 3.26 – – – – 608 Hu 1-1 00 28 15.614 +55 57 54.71 0.2 0.665 10 3.59 28 26 3.86 0.187 609 Hu 1-2 21 33 08.349 +39 38 09.57 0.211 1.849 6.5 4.21 107 155 2.53 0.08 610 Hu 2-1 18 49 47.562 +20 50 39.46 0.782 5.679 1.8 4.24 42.6 110 4.52 0.039 612 IC 1297 19 17 23.459 −39 36 46.40 0.32 1.45 7 3.93 59.4 68.9 3.75 0.127 614 IC 1747 01 57 35.896 +63 19 19.36 0.499 2.162 13 4.28 85.8 124 2.23 0.141 615 IC 2003 03 56 21.984 +33 52 30.59 0.245 1.539 10 3.93 54.8 30 3.89 0.189 616 IC 2149 05 56 23.908 +46 06 17.32 0.786 9.271 8.4 5.48 177 280 2.03 0.083 617 IC 2165 06 21 42.775 −12 59 13.96 0.485 4.793 9 4.21 180 188 2.47 0.108 618 IC 2448 09 07 06.261 −69 56 30.74 0.417 1.94 10 5.02 – 73 3.41 0.165 619 IC 2501 09 38 47.213 −60 05 30.92 1.939 13.312 2 4.99 – 261 2.09 0.02 620 IC 2553 10 09 20.856 −62 36 48.40 0.817 5.105 9 4.38 – 92 2.85 0.124 621 IC 2621 11 00 20.111 −65 14 57.77 2.614 15.35 5 4.89 – 195 2.94 0.071 622 IC 289 03 10 19.273 +61 19 00.91 – 5.7 36.8 7.95 152 170 1.18 0.211 623 IC 351 03 47 33.143 +35 02 48.50 – 0.637 7 3.51 31.9 27 4.45 0.151 624 IC 3568 12 33 06.834 +82 33 50.29 0.34 3.57 18 5.27 94.1 95 2.47 0.216 626 IC 4191 13 08 47.343 −67 38 37.67 0.961 9.494 14 4.67 – 172 1.95 0.132 627 IC 4406 14 22 26.278 −44 09 04.35 – 1.841 20 5.83 – 110 1.5 0.145 628 IC 4593 16 11 44.545 +12 04 17.06 0.375 9.95 12.8 5.16 90.6 92 2.42 0.15 629 IC 4634 17 01 33.572 −21 49 32.77 0.505 6.146 5.5 4.38 116 100 3.47 0.093 630 IC 4637 17 05 10.506 −40 53 08.44 – 9.044 18.6 5.7 – 132.5 2.29 0.207 631 IC 4642 17 11 45.025 −55 24 01.47 – 2.797 16.6 5.51 – 60 2.52 0.203 633 IC 4673 18 03 18.408 −27 06 22.61 0.692 3.057 16 5.02 53.4 62 3.12 0.242 634 IC 4699 18 18 32.024 −45 59 01.70 – 0.283 5 2.86 – 20 4.91 0.119 635 IC 4732 18 33 54.633 −22 38 40.91 0.203 – 3 – 12.2 49 4.79 0.07 636 IC 4846 19 16 28.220 −09 02 36.57 0.131 2.038 2.9 3.85 38.7 43 5.72 0.08 637 IC 4997 20 20 08.741 +16 43 53.71 1.143 16.078 2 4.97 30.1 127 5.45 0.053 638 IC 5117 21 32 31.027 +44 35 48.53 6.448 26.937 1.5 5.6 34.1 210 5.01 0.036 639 IC 5217 22 23 55.725 +50 58 00.43 0.278 1.772 6.5 3.89 50.4 163 2.71 0.085 643 J 320 05 05 34.313 +10 42 22.73 – 0.545 7.1 3.32 29.6 23 4.63 0.159 644 J 900 06 25 57.275 +17 47 27.19 1.467 4.976 6 4.24 107.8 100 3.29 0.096 653 KFL 15 18 14 19.324 −25 20 51.22 – 0.451 8.5 3.31 11 11.2 – – 681 K 2-16 16 44 49.050 −28 04 04.56 2.535 – – – – – – – 687 K 3-11 18 41 07.311 −08 55 58.97 0.154 3.265 3 3.99 14.5 17 7.33 0.107 688 K 3-13 18 45 24.582 +02 01 23.85 – 1.335 3.7 3.54 30.6 34 5.5 0.099 689 K 3-14 18 48 32.821 +10 35 50.74 – 0.667 1 3.31 – 4.8 16.89 0.082 690 K 3-15 18 51 41.522 +09 54 53.06 0.478 – 0.3 – – 4 – – 692 K 3-17 18 56 18.171 +07 07 26.31 1.967 18.124 8 5.47 319.5 345 2.04 0.079 693 K 3-18 19 00 34.829 −02 11 57.62 – 9.729 3.5 4.82 – 11 13.98 0.235 694 K 3-19 19 01 36.575 −01 19 07.85 0.131 1.262 1.2 3.56 11.8 23 8.93 0.052 695 K 3-2 18 25 00.576 −01 30 52.64 0.082 2.431 2.8 3.77 25.9 31 6.37 0.086 698 K 3-22 19 09 26.658 +12 00 44.05 0.832 0.715 – 3.21 – – – – 699 K 3-24 19 12 05.820 +15 09 04.47 – 0.268 6.2 2.7 8.5 – – – 700 K 3-26 19 14 39.178 +00 13 36.29 – 0.286 – 3.03 6.4 0.5 – – 702 K 3-29 19 15 30.561 +14 03 49.83 0.869 7.708 1 4.29 13.9 65 8.07 0.039 703 K 3-3 18 27 09.338 +01 14 26.88 0.321 1.614 10 4.05 35.9 34 3.43 0.166 704 K 3-30 19 16 27.691 +05 13 19.47 0.11 0.662 3.3 3.23 12.1 23 6.46 0.103 705 K 3-31 19 19 02.666 +19 02 20.85 0.269 2.394 1.5 3.86 16.8 39 7.83 0.057 706 K 3-33 19 22 26.670 +10 41 21.39 – 1.613 1.1 3.83 8.6 17 11.33 0.06 708 K 3-35 19 27 44.036 +21 30 03.83 0.37 6.017 1.7 4.35 14.5 60 6.56 0.054 709 K 3-36 19 32 39.557 +07 27 51.57 – 0.164 – 1.88 3.1 0.2 – – 710 K 3-37 19 33 46.749 +24 32 27.09 – 0.466 2.5 2.97 14.4 17 7.93 0.096 711 K 3-38 19 35 18.354 +17 13 00.71 0.236 1.362 5 3.81 28.7 31 5.09 0.123 712 K 3-39 19 35 54.469 +24 54 48.20 0.393 4.122 1 4.15 3.6 11 13.35 0.065 713 K 3-4 18 31 00.227 +02 25 27.35 – 0.18 21 2.84 17 21 – – 714 K 3-40 19 36 21.828 +23 39 47.93 0.216 1.597 4 3.76 17.1 20 6.18 0.12 720 K 3-49 19 54 00.702 +33 22 12.95 0.227 2.631 – 3.87 5.5 7 34.5 – 721 K 3-5 18 31 45.833 +04 05 09.12 0.109 0.276 10 2.86 6.7 3 7.11 0.345 723 K 3-52 20 03 11.435 +30 32 34.15 0.877 7.924 0.7 4.28 16.9 65 9.42 0.032 724 K 3-53 20 03 22.475 +27 00 54.73 1.36 7.328 0.9 4.31 10 69 9.27 0.04 725 K 3-54 20 04 58.639 +25 26 37.36 0.155 0.638 0.8 3.29 4.8 7.5 16.39 0.064 726 K 3-55 20 06 56.210 +32 16 33.60 0.325 2.551 8.2 4.05 86.6 90 2.96 0.118 728 K 3-57 20 12 47.679 +34 20 32.52 0.245 1.861 6.3 3.96 46.8 60 3.72 0.114 731 K 3-60 21 27 26.477 +57 39 06.45 0.962 3.113 1.9 3.92 28 43 6.87 0.063 732 K 3-61 21 30 00.710 +54 27 27.45 0.118 0.606 6 3.25 16.6 14 5.73 0.167 733 K 3-62 21 31 50.203 +52 33 51.64 0.748 6.41 2.5 4.29 59.5 115 4.62 0.056 734 K 3-63 21 39 11.976 +55 46 03.94 – 0.443 7 3.18 8.5 29 – – 737 K 3-66 04 36 37.243 +33 39 29.87 – 0.91 2.1 3.24 15.4 18 8.42 0.086 738 K 3-67 04 39 47.905 +36 45 42.85 0.119 1.456 2.2 3.74 33.3 42 6.49 0.069