90 PHILLIPS & MÁRQUEZ-LUGO

TABLE 1 (CONTINUED)

KN NAME R.A. (2000) DEC (2000) F (9 μm) F (18 μm) θ MN 18 F(1.4 GHz) F(5 GHz) DIST DIAM

H:M:S D:M:S Jy Jy arcsec arcsec mJy mJy kpc pc

740 K 3-69 05 41 22.147 +39 15 08.09 0.162 0.838 0.46 3.4 2.9 0.4 13.87 0.031 741 K 3-7 18 34 13.601 −02 27 36.41 0.287 1.77 6.3 3.85 29.5 30 4.52 0.138 746 K 3-76 20 25 04.865 +33 34 50.70 – 0.539 0.2 3.76 5.1 12 – – 747 K 3-78 20 45 22.710 +50 22 39.92 0.146 0.911 3.8 3.55 14.9 15 6.85 0.126 750 K 3-82 21 30 51.636 +50 00 06.96 – 0.951 24 4.73 35.6 30 2.49 0.29 751 K 3-83 21 35 43.877 +50 54 16.94 – 0.172 5 1.92 4.7 6.5 7.71 0.187 753 K 3-87 22 55 06.987 +56 42 31.14 – 0.181 6 2.45 10.6 4.5 7.91 0.23 755 K 3-90 01 24 58.628 +65 38 36.14 – 0.339 8.5 3.25 12.4 13.9 4.6 0.19 761 K 4-19 19 13 22.624 +03 25 00.30 – 0.708 – 3.33 – – – – 762 K 4-28 19 30 16.668 +14 47 21.84 0.129 2.229 0.6 3.82 5 19 14.27 0.042 764 K 4-41 19 56 34.027 +32 22 12.96 – 0.93 3 3.58 11.5 15 7.59 0.11 765 K 4-47 04 20 45.157 +56 18 11.57 0.264 1.525 7.8 3.7 – 7.7 22.46 0.849 766 K 4-48 06 39 55.879 +11 06 30.69 – 0.707 2.2 3.11 11.8 14 8.86 0.095 770 K 4-57 22 48 34.363 +58 29 08.18 1.46 1.081 – 3.41 – – – – 771 K 4-8 18 54 20.003 −08 47 33.17 – 0.229 – 2.91 3.1 – – – 773 KjPn 2 20 15 22.209 +40 34 44.76 0.093 0.661 – 3.36 7.3 – – – 781 LoTr 5 12 55 33.745 +25 53 30.60 0.137 – 10.6 – – 5.6 8.69 0.447 798 MA 13 18 30 30.388 −07 27 38.29 0.182 – – – 28.7 – – – 800 MA 3 18 17 49.379 −06 48 21.55 – 0.564 – 3.19 6.3 – – – 801 MGP 1 16 48 48.548 −35 00 57.39 – 0.601 9 3.26 14.7 10.2 – – 802 M 1-1 01 37 19.430 +50 28 11.50 – 0.433 4.5 2.92 14 8 7.27 0.159 803 M 1-11 07 11 16.693 −19 51 02.87 6.754 31.786 2.2 5.52 25.9 113 4.9 0.052 804 M 1-12 07 19 21.471 −21 43 55.46 1.03 5.606 1.8 4.21 21.9 41 7.13 0.062 805 M 1-13 07 21 14.952 −18 08 36.91 – 0.502 10 3.31 18.9 15 4.51 0.219 807 M 1-16 07 37 18.955 −09 38 49.67 0.195 1.148 3.6 3.67 31.3 31 5.71 0.1 808 M 1-17 07 40 22.206 −11 32 29.81 0.204 0.982 2.5 3.57 18.3 17 8.23 0.1 810 M 1-19 17 03 46.809 −33 29 43.75 – 1.881 2.8 3.8 23.2 20 – – 811 M 1-2 01 58 49.675 +52 53 48.57 0.861 1.862 0.5 3.64 – 10 – – 814 M 1-24 17 38 11.588 −19 37 37.64 0.243 3.627 <10 4.34 43.5 – – – 815 M 1-25 17 38 30.307 −22 08 38.88 0.237 – 3.2 – 39.9 57 4.93 0.076 816 M 1-26 17 45 57.653 −30 12 00.58 – 104.933 3.2 7.32 66 400 2.42 0.038 817 M 1-27 17 46 45.450 −33 08 35.06 0.446 – 8 – 64.9 63 3.74 0.145 818 M 1-29 17 50 18.003 −30 34 54.90 – 4.343 8.2 4.21 91.5 97 3.3 0.131 820 M 1-31 17 52 41.440 −22 21 56.83 0.435 5.727 2.3 4.23 28.8 60.5 – – 821 M 1-32 17 56 19.980 −16 29 03.95 1.481 8.938 9 4.63 70.1 61 3.17 0.138 822 M 1-33 17 58 58.794 −15 32 14.79 0.495 4.194 4 4.03 49 60 4.63 0.09 823 M 1-34 18 01 22.193 −33 17 43.08 – 0.575 11.2 3.68 13.6 14.7 5.95 0.323 824 M 1-35 18 03 39.255 −26 43 33.47 0.514 3.572 <25 4.06 54 54 4.63 – 825 M 1-37 18 05 25.801 −28 22 04.19 0.208 3.508 2.5 4.06 10.9 15 8.44 0.102 826 M 1-38 18 06 05.765 −28 40 29.28 – 3.049 3.5 4.06 14.9 24 6.58 0.112 827 M 1-39 18 07 30.699 −13 28 47.61 0.692 – 4 – 58.2 100 3.92 0.076 828 M 1-4 03 41 43.428 +52 17 00.28 0.284 1.806 6 3.89 77.8 90 3.39 0.099 829 M 1-40 18 08 25.994 −22 16 53.25 1.187 11.344 4.5 4.75 163.3 208 2.83 0.062 831 M 1-42 18 11 05.028 −28 58 59.33 – 0.9 9 3.53 28.3 28.5 4.89 0.213 833 M 1-44 18 16 17.365 −27 04 32.47 0.336 0.841 4 3.37 9.4 9 9.24 0.179 834 M 1-45 18 23 07.984 −19 17 05.26 – 3.09 2.5 4.04 15.1 19 7.43 0.09 835 M 1-46 18 27 56.339 −15 32 54.43 0.327 – 11.5 – 78.1 81 2.58 0.144 838 M 1-5 05 46 50.000 +24 22 02.32 0.86 4.338 2.3 3.98 41.1 71 5.49 0.061 839 M 1-50 18 33 20.886 −18 16 36.86 0.285 2.153 5.6 3.95 35.4 50 4.12 0.112 841 M 1-52 18 33 58.542 −14 52 25.02 – 0.303 43.1 3.17 7.8 319 5.93 1.24 842 M 1-53 18 35 48.267 −17 36 08.71 0.126 1.422 6 4.16 19.6 8 3.93 0.114 843 M 1-54 18 36 08.357 −16 59 57.02 0.215 0.933 13 3.57 35.5 53 3.09 0.195 844 M 1-55 18 36 42.550 −21 48 59.09 1.613 0.475 <25 3.07 – 38 – – 845 M 1-56 18 37 46.250 −17 05 46.55 0.195 2.641 1.5 3.84 14.6 22 9.48 0.069 846 M 1-57 18 40 20.248 −10 39 47.17 0.413 5.209 8 4.37 53.9 70 3.21 0.125 847 M 1-58 18 42 56.979 −11 06 53.10 0.229 – 6.4 – 37.7 60 3.69 0.114 848 M 1-59 18 43 20.178 −09 04 48.64 0.899 3.844 4.8 4.03 90.1 108 3.54 0.082 849 M 1-6 06 35 45.140 −00 05 37.37 1.139 5.895 3 4.25 54.4 86 4.7 0.068 851 M 1-61 18 45 55.072 −14 27 37.93 – 13.886 1.8 4.81 32.5 97 5.59 0.049 852 M 1-62 18 50 26.030 −22 34 22.54 – 0.23 1.5 2.39 13.5 12.8 – – 855 M 1-65 18 56 33.639 +10 52 10.05 – 1.665 4 3.79 21 23 5.94 0.115 856 M 1-66 18 58 26.247 −01 03 45.70 0.215 – 2.7 – 45.7 59 5.39 0.071 857 M 1-67 19 11 30.881 +16 51 38.21 0.955 – 120.4 – 217.6 250 0.69 0.403 858 M 1-69 19 13 53.961 +03 37 41.90 0.23 1.813 – 3.85 31.4 – – – 859 M 1-7 06 37 20.955 +24 00 35.38 – 0.422 11 3.18 18.5 13 4.5 0.24 860 M 1-71 19 36 26.927 +19 42 23.99 1.507 15.253 3 4.89 83.8 204 – – 861 M 1-72 19 41 33.975 +17 45 17.71 0.547 6.554 0.7 4.25 5.3 30 12.54 0.043 862 M 1-73 19 41 09.323 +14 56 59.37 0.16 3.83 6 4.27 47.7 43 4.17 0.121 863 M 1-74 19 42 18.874 +15 09 08.16 0.292 3.285 1 3.99 7.9 29 10.15 0.049 864 M 1-75 20 04 44.086 +31 27 24.42 0.187 0.739 14 3.81 36.5 26.2 3.32 0.225 865 M 1-77 21 19 07.360 +46 18 47.24 1.874 6.154 8 5.23 29.4 25 4.29 0.166 866 M 1-78 21 20 44.809 +51 53 27.88 19.514 226.731 6 8.41 363.5 1103.9 1.62 0.047 868 M 1-8 06 53 33.795 +03 08 26.96 – 0.303 18.4 2.92 16.3 23 3.06 0.273 869 M 1-80 22 56 19.806 +57 09 20.68 – 0.336 8 2.96 17.9 25 4.29 0.166 870 M 1-9 07 05 19.204 +02 46 59.16 0.113 0.941 2.3 3.34 22.4 27 7.22 0.081 873 M 2-12 17 24 01.451 −25 59 23.16 – 2.228 4.4 3.85 10.3 12.9 – – 874 M 2-13 17 28 34.188 −13 26 20.82 – 0.888 1.5 3.35 9.7 13 10.68 0.078 876 M 2-15 17 46 54.449 −16 17 24.80 – 0.87 7.4 3.64 18.7 12.5 5.37 0.193 877 M 2-16 17 52 34.362 −32 45 51.10 – 1.38 2.5 3.56 20.4 24.8 5.86 0.071 878 M 2-17 17 52 04.896 −17 36 05.23 0.107 – 8 – 10.6 10 5.57 0.216 879 M 2-18 17 53 37.844 −32 58 47.93 – 1.349 1.5 3.69 11.1 17 9.4 0.068 880 M 2-19 17 53 45.619 −29 43 46.34 0.182 0.52 7.5 3.27 10.5 14 7.4 0.269 881 M 2-2 04 13 15.045 +56 56 58.08 0.31 1.828 6.5 4.57 52 54 3.66 0.115 882 M 2-20 17 54 25.422 −29 36 08.20 0.127 1.934 16.4 3.83 22.2 3.2 – – 883 M 2-21 17 58 09.565 −29 44 20.08 0.305 0.789 3 3.42 20.3 23 7.01 0.102 884 M 2-22 17 58 32.634 −33 28 36.60 – 0.49 5.2 2.92 9.1 6.5 9.87 0.249