MID- AND FAR-INFRARED PHOTOMETRY OF GALACTIC PNE 91

TABLE 1 (CONTINUED)

KN NAME R.A. (2000) DEC (2000) F (9 μm) F (18 μm) θ MN 18 F(1.4 GHz) F(5 GHz) DIST DIAM

H:M:S D:M:S Jy Jy arcsec arcsec mJy mJy kpc pc

885 M 2-23 18 01 42.610 −28 25 43.90 – 6.155 8.8 3.98 4.2 41 8.38 0.358 886 M 2-24 18 02 02.881 −34 27 47.07 – 3.19 6.8 3.94 3.2 3 11.79 0.389 888 M 2-26 18 03 11.844 −26 58 30.23 – 0.398 7 2.76 7.9 5 9.43 0.32 889 M 2-27 18 03 52.588 −31 17 46.54 – 3.369 3.8 4 22.5 50 5.65 0.104 890 M 2-28 18 05 02.695 −30 58 17.39 – 0.508 5.3 3.22 11.3 10 8.39 0.216 891 M 2-29 18 06 40.862 −26 54 55.95 – 1.179 <5 4.08 9.4 8 9.98 – 892 M 2-30 18 12 34.414 −27 58 11.59 0.131 0.924 3.5 3.4 13.9 14 8.1 0.137 893 M 2-31 18 13 16.026 −25 30 04.97 0.223 1.653 4 3.66 39.6 51 4.91 0.095 894 M 2-32 18 14 50.617 −32 36 55.21 – 0.585 <10 3.29 9.5 – – – 895 M 2-33 18 15 06.534 −30 15 32.89 – 1.138 5 3.77 11.9 12 8.52 0.207 898 M 2-36 18 17 41.418 −29 08 19.59 0.218 – 6.8 – 22.6 13 6.99 0.23 900 M 2-38 18 19 25.162 −26 35 19.92 – 0.522 8 3.2 7.5 8 8.13 0.315 901 M 2-39 18 22 01.148 −24 10 40.18 0.211 0.802 3.2 3.37 7.2 8 10.21 0.158 902 M 2-4 17 01 06.231 −34 49 38.58 0.194 2.996 2 3.87 24.5 32 7.15 0.069 903 M 2-40 18 21 23.851 −06 01 55.79 – 3.62 5.5 4.19 45.5 33 4.67 0.125 905 M 2-42 18 22 32.020 −24 09 28.40 – 0.455 3.9 3.08 9.6 14 7.83 0.148 906 M 2-43 18 26 40.048 −02 42 57.63 9.659 32.6 1.5 5.68 20.4 237 5 0.036 907 M 2-44 18 37 36.908 −03 05 55.96 0.385 2.105 8 3.89 48.3 54 3.45 0.134 908 M 2-45 18 39 21.837 −04 19 50.90 0.76 6.161 6.4 4.28 107 154 2.64 0.082 909 M 2-46 18 46 34.620 −08 28 01.85 0.111 0.455 4.4 3.12 13.1 12 6.48 0.138 910 M 2-47 19 13 34.559 +04 38 04.45 0.18 2.89 6 4.04 38.3 45 4.12 0.12 911 M 2-48 19 50 28.543 +25 54 30.21 – 0.376 4 2.79 16.9 19 7 0.136 912 M 2-49 21 43 17.624 +50 25 14.57 0.408 1.202 2.5 3.5 28.2 35 6.47 0.078 913 M 2-5 17 02 19.069 −33 10 05.01 0.202 – 5 – 14.1 12 7.69 0.186 914 M 2-50 21 57 41.814 +51 41 39.01 – 0.183 4.6 2.45 8.2 6.5 8.07 0.18 916 M 2-52 22 20 30.745 +57 36 21.62 – 0.133 13.5 2.39 14.9 14 3.97 0.26 917 M 2-53 22 32 17.720 +56 10 26.12 – 0.291 18 2.74 14.6 11 3.64 0.318 918 M 2-54 22 51 38.923 +51 50 42.50 0.22 6.06 – 4.19 5.4 8 14.61 – 920 M 2-6 17 04 18.326 −30 53 28.71 – 0.751 2 3.15 13.6 17 – – 922 M 2-8 17 05 30.673 −32 32 08.30 0.231 0.921 4 3.5 16.2 18 7.27 0.141 923 M 2-9 17 05 37.952 −10 08 34.58 38.07 73.255 17.5 6.93 37.1 36 3.01 0.255 924 M 3-1 07 02 49.980 −31 35 31.50 – 0.21 11.2 2.71 25.7 24 3.78 0.205 925 M 3-10 17 27 20.152 −28 27 51.15 0.311 2.611 3.1 3.81 35.2 29 6.33 0.095 926 M 3-12 17 36 22.634 −21 31 12.22 – 0.616 7.5 3.01 11.2 12.5 6.98 0.254 927 M 3-13 17 41 36.594 −22 13 02.46 0.862 1.893 <7 3.73 – – – – 928 M 3-14 17 44 20.598 −34 06 40.59 0.344 1.89 4 3.91 22.6 30 6.47 0.125 930 M 3-17 17 56 25.640 −31 04 16.82 – 1.075 <5 3.43 10 12 9 – 931 M 3-19 17 58 19.337 −30 00 39.32 – 0.8 7 3.5 7.9 7.4 8.62 0.293 933 M 3-20 17 59 19.318 −28 13 48.05 0.091 – 4 – 16.2 40 5.3 0.103 934 M 3-21 18 02 32.324 −36 39 12.24 0.265 2.617 <5 3.92 15.6 30 5.57 – 935 M 3-22 18 02 19.238 −30 14 25.38 – 0.451 6.4 3.15 10.1 8.7 8.45 0.262 936 M 3-23 18 07 06.148 −30 34 16.96 0.231 1.245 11.5 3.85 30 28 4.58 0.255 937 M 3-24 18 07 53.914 −25 24 02.71 – 0.887 <25 3.4 17.4 – – – 938 M 3-25 18 15 16.967 −10 10 09.47 0.831 – 1.5 – 25 76 6.89 0.05 939 M 3-26 18 16 11.405 −27 14 57.46 – 0.479 7 2.96 8.1 8 8.4 0.285 940 M 3-27 18 27 48.273 +14 29 06.06 0.21 0.996 1 3.55 – 53.2 8.55 0.041 941 M 3-28 18 32 41.288 −10 05 50.03 – 1.446 9 5.11 – 33 4.87 0.212 945 M 3-31 18 44 01.767 −19 54 52.52 – 1.205 <10 3.44 – 9 14.79 – 946 M 3-32 18 44 43.127 −25 21 33.85 0.159 0.705 7.5 3.27 12.2 12 7.06 0.257 947 M 3-33 18 48 12.131 −25 28 52.39 – 0.47 6 3.32 9.8 7.5 8.94 0.26 948 M 3-34 19 27 01.897 −06 35 04.63 0.154 1.764 8 3.91 29.6 29 4.12 0.16 949 M 3-35 20 21 03.769 +32 29 23.86 3.437 16.454 1.5 4.97 29.5 140 5.62 0.041 950 M 3-36 17 12 39.152 −25 43 37.39 – 0.577 3.2 3.22 4.9 3.5 13.92 0.216 953 M 3-39 17 21 11.505 −27 11 38.13 1.177 – 19 – 279.4 280 1.7 0.157 956 M 3-41 17 25 59.784 −29 21 50.15 – 1.007 <25 3.35 11.3 75 4.15 – 958 M 3-43 17 50 24.297 −29 25 18.70 – 2.05 3.8 3.64 – 27.2 6.2 0.114 959 M 3-44 17 51 18.894 −30 23 52.99 0.342 6.899 4.2 4.35 24.3 35 – – 960 M 3-45 17 52 05.927 −30 05 13.81 – 0.614 3.5 3 20.4 24.3 – – 965 M 3-5 08 02 28.932 −27 41 55.44 – 0.286 7 2.91 11 10 5.9 0.2 969 M 3-53 18 24 07.890 −11 06 42.08 0.233 1.24 – 3.61 19.5 – – – 970 M 3-54 18 33 03.745 −13 44 19.95 – 0.422 5.6 3.01 8.6 8 6.92 0.188 972 M 3-6 08 40 40.205 −32 22 33.22 0.407 5.983 11 4.95 77.4 75 2.74 0.146 973 M 3-7 17 24 34.429 −29 24 19.47 0.096 1.553 5 3.08 32.9 28 5.41 0.131 974 M 3-8 17 24 52.152 −28 05 54.61 0.297 – 3.2 – 18 20 7.45 0.116 975 M 3-9 17 25 43.364 −26 11 55.47 0.364 2.22 16 3.81 37.3 35 3.88 0.301 976 M 4-10 18 34 13.821 −13 12 24.57 – 1.92 1.2 3.81 12.1 33 9.04 0.053 979 M 4-17 20 09 01.927 +43 43 43.54 – 0.447 – 3.36 20 – – – 980 M 4-18 04 25 50.831 +60 07 12.72 1.687 6.346 3.75 4.22 18.5 22 6.37 0.116 981 M 4-2 07 28 53.808 −35 45 13.92 – 0.481 6 3.25 24.2 19 5.26 0.153 983 M 4-4 17 28 50.344 −30 07 44.47 0.088 – – – 13.9 9.8 – – 985 M 4-7 17 51 44.663 −31 36 00.18 – 0.775 5.7 3.18 38 33 5.2 0.144 986 M 4-8 18 12 09.587 −10 42 58.30 0.117 2.155 1.4 3.67 10.7 19 10.21 0.069 989 MaC 1-11 18 14 50.890 −22 43 55.43 – 0.399 – 3.01 12.2 – – – 990 MaC 1-13 18 28 35.242 −08 43 22.82 – 0.683 – 3.5 30.4 – – – 1000 MeWe 1-7 16 47 57.070 −50 42 48.32 – 0.356 – 3.3 – – – – 1003 Me 1-1 19 39 09.813 +15 56 48.13 0.45 0.931 4.7 3.46 36 45.1 4.58 0.104 1004 Me 2-1 15 22 19.274 −23 37 31.34 – 0.93 7 3.55 33.6 30 4.32 0.147 1005 Me 2-2 22 31 43.686 +47 48 03.96 0.606 2.556 1.2 3.85 16 40 8.56 0.05 1006 MyCn 18 13 39 35.116 −67 22 51.45 0.862 10.869 12.6 4.66 – 106 3.23 0.197 1007 My 60 10 31 33.390 −55 20 50.87 0.244 1.646 7.6 4.29 – 60 3.47 0.128 1009 Mz 2 16 14 32.433 −54 57 03.76 – 1.763 23 5.5 – 75 2 0.223 1010 Mz 3 16 17 13.392 −51 59 10.31 55.324 267.948 25.4 8.95 – 649 1.03 0.127 1014 NGC 1535 04 14 15.762 −12 44 22.03 1.037 5.562 18.4 8.8 167.8 160 1.77 0.158 1015 NGC 2022 05 42 06.229 +09 05 10.75 0.371 3.789 19.4 6.04 92.3 91 2.02 0.19 1017 NGC 2346 07 09 22.547 −00 48 22.98 0.505 0.595 54.6 3.64 37.6 86 2.07 0.548 1019 NGC 2392 07 29 10.768 +20 54 42.44 0.476 4.368 44.8 6.48 279.9 251 1.44 0.313