92 PHILLIPS & MÁRQUEZ-LUGO

TABLE 1 (CONTINUED)

KN NAME R.A. (2000) DEC (2000) F (9 μm) F (18 μm) θ MN 18 F(1.4 GHz) F(5 GHz) DIST DIAM

H:M:S D:M:S Jy Jy arcsec arcsec mJy mJy kpc pc

1021 NGC 2452 07 47 26.248 −27 20 07.16 0.288 1.798 18.8 4.71 56 57 2.31 0.211 1024 NGC 2792 09 12 26.596 −42 25 39.90 0.399 3.618 13 5.13 – 116 1.26 0.079 1026 NGC 2867 09 21 25.337 −58 18 40.69 1.312 7.277 16 4.98 – 252 1.69 0.131 1028 NGC 3132 10 07 01.771 −40 26 11.11 0.883 3.437 45 8.18 – 230 1.5 0.327 1029 NGC 3195 10 09 20.910 −80 51 30.73 – 0.933 40 5.07 – 35 1.96 0.38 1030 NGC 3211 10 17 50.549 −62 40 14.57 0.286 2.113 16 4.52 – 228 1.7 0.132 1031 NGC 3242 10 24 46.138 −18 38 32.26 3.211 19.833 37.2 8.87 757.7 860 0.94 0.17 1034 NGC 3918 11 50 17.730 −57 10 56.90 2.747 27.613 18.8 6.14 – 859 1.17 0.107 1035 NGC 40 00 13 01.023 +72 31 19.07 – 54.443 36.4 9.48 510.3 460 0.98 0.173 1037 NGC 4361 12 24 30.754 −18 47 05.51 – 4.061 81 9.86 159.9 207 0.74 0.291 1039 NGC 5307 13 51 03.273 −51 12 20.62 0.26 2.349 12.6 4.41 – 95 2.42 0.148 1040 NGC 5315 13 53 56.972 −66 30 50.96 3.477 34.483 6 5.93 – 442 2.14 0.062 1042 NGC 5882 15 16 49.941 −45 38 58.60 2.331 17.353 14 5.78 – 334 1.74 0.118 1048 NGC 6210 16 44 29.521 +23 47 59.55 1.429 13.331 16.2 5.64 297.8 311 1.55 0.122 1050 NGC 6309 17 14 04.322 −12 54 37.71 – 6.375 17 5.63 131.5 151 2.35 0.194 1051 NGC 6326 17 20 46.301 −51 45 15.33 0.248 1.149 12 4.03 – 70 2.71 0.158 1053 NGC 6369 17 29 20.443 −23 45 34.22 7.301 43.871 28 8.47 1825 2002 0.75 0.102 1054 NGC 6439 17 48 19.797 −16 28 44.21 0.37 – 5 – 51.5 55 4.64 0.112 1056 NGC 6537 18 05 13.059 −19 50 34.86 4.099 26.593 4.7 5.63 427.5 640 1.77 0.04 1057 NGC 6543 17 58 33.409 +66 37 58.79 5.539 57.323 18.8 7.39 771.5 850 1.12 0.102 1059 NGC 6565 18 11 52.470 −28 10 42.27 – 1.057 9.2 3.88 47 37 4.36 0.194 1060 NGC 6567 18 13 45.136 −19 04 33.67 1.778 4.466 8.8 4.19 163 168 2.4 0.102 1061 NGC 6572 18 12 06.404 +06 51 12.17 9.597 93.442 10 7.06 557.5 1374 1.06 0.051 1062 NGC 6578 18 16 16.517 −20 27 02.67 1.357 – 8.6 – 158.2 170 2.31 0.096 1063 NGC 6620 18 22 54.186 −26 49 17.00 0.146 0.802 5 3.43 17.1 20.5 6.42 0.156 1064 NGC 6629 18 25 42.449 −23 12 10.59 0.799 – 15 – 257.8 275 1.84 0.134 1065 NGC 6644 18 32 34.641 −25 07 44.00 – 5.547 2.8 5.22 64.3 97 4.09 0.056 1067 NGC 6741 19 02 37.088 −00 26 56.97 0.682 4.923 8 4.25 131.9 230 2.32 0.09 1068 NGC 6751 19 05 55.560 −05 59 32.92 1.398 11.455 21 5.54 55.1 63 2.18 0.222 1071 NGC 6778 19 18 24.939 −01 35 47.41 0.463 1.644 15.8 4.39 64.6 55 2.54 0.195 1073 NGC 6790 19 22 56.965 +01 30 46.45 6.636 21.477 1.8 5.22 52.6 290 4.1 0.036 1074 NGC 6803 19 31 16.490 +10 03 21.88 0.603 5.242 5 4.15 68.9 114 3.26 0.079 1076 NGC 6807 19 34 33.543 +05 41 02.58 0.22 2.85 0.8 3.94 8 29 11.18 0.043 1077 NGC 6818 19 43 57.844 −14 09 11.91 0.851 6.01 18.2 5.55 290.2 300 1.47 0.13 1078 NGC 6826 19 44 48.161 +50 31 30.33 2.539 24.006 25.4 8.75 414.4 385 1.2 0.148 1083 NGC 6879 20 10 26.682 +16 55 21.30 0.111 0.831 5 3.59 23.1 18 5.78 0.14 1084 NGC 6881 20 10 52.464 +37 24 41.18 0.972 9.369 2.6 4.5 70.4 120 4.48 0.056 1085 NGC 6884 20 10 23.669 +46 27 39.54 0.743 6.356 5.3 4.46 152.4 200 2.7 0.069 1086 NGC 6886 20 12 42.813 +19 59 22.65 0.543 4.595 5.5 4.24 77.6 108 2.94 0.078 1087 NGC 6891 20 15 08.838 +12 42 15.63 0.345 4.865 10.2 5.14 110.8 105 2.35 0.116 1089 NGC 6905 20 22 22.940 +20 06 16.80 – 2.166 40.4 6.79 66.7 52 1.62 0.317 1091 NGC 7009 21 04 10.877 −11 21 48.25 5.275 31.698 28.2 7.24 682 750 1.09 0.149 1093 NGC 7027 21 07 01.696 +42 14 09.50 173.674 977.249 12.5 9.36 1362.4 5200 0.64 0.039 1098 NGC 7354 22 40 19.940 +61 17 08.10 2.748 15.223 20 6.85 581 579 1.19 0.115 1099 NGC 7662 23 25 53.968 +42 32 05.04 2.377 15.165 20 6.74 611.5 631 1.17 0.113 1100 Na 1 17 12 51.900 −03 16 00.13 0.083 0.569 8 3.37 23 22.5 4.2 0.163 1105 PB 1 07 02 46.764 −13 42 34.65 – 0.639 – 3.92 11.9 18 – – 1106 PB 10 19 28 14.391 +12 19 36.17 0.322 2.045 8 3.94 50.4 50 3.53 0.137 1107 PB 2 08 20 40.188 −46 22 58.82 0.164 0.562 3 3.18 – 40 5.75 0.084 1108 PB 3 08 54 18.323 −50 32 22.34 0.256 1.635 7 3.84 – 70 3.4 0.115 1109 PB 4 09 15 07.747 −54 52 43.78 0.243 1.444 11.2 4.12 – 71 2.81 0.153 1110 PB 5 09 16 09.613 −45 28 42.79 3.014 11.328 5 4.71 – 107 – – 1111 PB 6 10 13 15.949 −50 19 59.28 0.33 3.205 11 4.18 – 30 3.55 0.189 1112 PB 8 11 33 17.717 −57 06 14.00 0.16 2.536 5 4.06 – 27 5.15 0.125 1113 PB 9 19 27 44.814 +10 24 20.82 0.103 1.029 7 3.74 33.1 40 3.57 0.121 1114 PC 11 16 37 42.697 −55 42 26.49 1.164 5.76 5 4.03 – 11 – – 1115 PC 12 16 43 53.781 −18 57 11.89 – 1.994 2.2 3.8 14.8 19 8.6 0.092 1117 PC 14 17 06 14.767 −52 30 00.40 0.136 0.809 7 3.64 – 30 4.32 0.147 1118 PC 17 17 35 41.677 −46 59 48.54 – 1.063 5 3.58 – 14.7 6.12 0.148 1120 PC 20 18 43 03.456 −00 16 37.02 0.212 1.123 – 3.59 27.3 – – – 1122 PC 22 19 42 03.514 +13 50 37.33 – 0.458 – 3.73 9.2 – – – 1123 PC 23 19 51 52.770 +32 59 17.48 0.053 0.691 2.2 3.27 10 21 8.06 0.086 1124 PC 24 20 19 38.133 +27 00 11.23 0.184 0.953 5 3.52 17.1 18 5.78 0.14 1127 PM 1-188 17 54 21.100 −15 55 51.78 6.838 4.779 – 3.92 – – – – 1128 PM 1-276 19 02 17.857 +10 17 34.49 – 1.065 – 4.78 15.3 – – – 1129 PM 1-295 19 19 18.760 +17 11 48.09 – 2.02 – 5.32 13.9 – – – 1130 PM 1-310 19 38 52.135 +25 05 32.63 0.4 – – – – – – – 1132 PM 1-89 15 19 08.724 −53 09 50.05 0.584 6.983 – 4.53 – – – – 1136 Pe 1-1 10 38 27.607 −56 47 06.40 0.846 8.744 3 4.48 – 125.3 4.16 0.061 1137 Pe 1-11 18 01 42.767 −33 15 26.30 – 0.779 9 3.51 10.9 8 7.9 0.345 1141 Pe 1-15 18 46 24.485 −07 14 34.57 0.079 0.722 5 3.49 8.3 8 7.4 0.179 1142 Pe 1-16 18 47 32.251 −06 54 03.52 – 0.555 – 3.33 14.2 – – – 1144 Pe 1-18 18 48 46.454 −05 56 07.71 0.486 – 1.1 – 6.6 42 8.44 0.045 1145 Pe 1-19 18 49 44.643 −07 01 35.03 – 0.366 3.9 3.15 4.8 6 8.42 0.158 1146 Pe 1-2 10 39 32.690 −57 06 13.70 0.269 2.818 – 4.1 – – – – 1147 Pe 1-20 18 57 17.351 −05 59 51.79 – 0.191 8.4 2.51 5.1 29.4 4.52 0.183 1148 Pe 1-21 18 57 49.642 −05 27 39.73 – 0.396 8.6 2.81 6.3 30 3.95 0.165 1151 Pe 1-7 16 30 25.852 −46 02 51.10 2.801 23.646 5 5.27 – 117 – – 1152 Pe 1-8 17 06 22.558 −44 13 09.96 – 2.47 – 5.23 – – – – 1158 Pe 2-14 18 29 59.545 −19 40 37.74 – 0.527 – 3.13 3.7 – – – 1160 Pe 2-4 09 30 48.402 −53 09 59.33 0.11 0.663 – 3.34 – – – – 1162 Pe 2-7 10 41 19.574 −56 09 16.34 0.043 0.511 – 3.18 – – – – 1163 Pe 2-8 15 23 42.860 −57 09 25.02 6.342 39.225 1.6 5.99 – 100 5.83 0.045 1167 SaSt 1-1 08 31 42.877 −27 45 31.70 – 1.819 – 3.77 – 0.3 – – 1168 SaSt 2-12 17 03 02.870 −53 55 54.16 0.175 1.161 – 3.59 – – – – 1169 SaSt 2-3 07 48 03.683 −14 07 40.40 – 0.151 – 2 4 1.4 – –