94 PHILLIPS & MÁRQUEZ-LUGO

TABLE 2 GALACTIC PNE IDENTIFIED IN THE AKARI FIS CATALOGUE

KN NAME R.A. (2000) DEC (2000) F (65 μm) F (90 μm) F (140 μm) F (160 μm) QUAL DIAM F (1.4 GHz) F(5 GHz) DIST DIAM

H:M:S D:M:S) Jy Jy Jy Jy arcsec mJy mJy kpc pc

1 000.6+08.8 17 14 09.788 −23 31 53.41 1.04 1.86 1.987 2.565 1311 – 10.7 – – – 3 008.1+08.2 17 33 35.332 −17 41 16.23 1.046 1.678 0.757 2.497 1311 – 7.5 – – – 6 050.6+19.7 18 08 20.083 +24 10 43.26 2.136 1.05 0.462 – 1311 – – – – – 7 099.3−01.9 22 04 12.301 +53 04 01.36 10.186 8.225 2.369 1.474 3311 – – – – – 10 341.4−09.0 17 35 02.502 −49 26 26.38 46.648 22.854 5.621 5.089 3331 – – – – – 11 A 12 06 02 20.045 +09 39 14.09 2.902 3.487 2.301 2.519 1311 37 38.3 36 2.04 0.37 18 A 2 00 45 34.678 +57 57 34.88 – 0.672 0.008 0.334 1311 30.9 7.6 2.3 4.68 0.7 21 A 23 07 43 17.984 −34 45 15.64 – 0.964 0.067 0.835 1311 54 4.2 6.8 2.74 0.72 23 A 26 08 09 01.644 −32 40 24.91 0.253 1.234 1.051 3.25 1311 40 22.5 2.4 4.11 0.8 27 A 30 08 46 53.514 +17 52 45.47 89.781 56.794 26.965 21.707 3333 4.47 – 2.3 2.55 0.06 35 A 40 16 48 34.515 −21 00 50.67 1.165 1.264 2.47 0.438 1311 34 4.5 2 10.2 1.68 41 A 46 18 31 18.290 +26 56 12.86 0.826 0.95 1.52 0.955 1321 63.4 – 5 2.74 0.84 44 A 49 18 53 28.292 −06 28 46.83 0.499 1.17 2.701 – 1311 45 – – – – 47 A 52 19 04 32.342 +17 57 07.13 0.767 1.299 – – 1311 – 3.4 – – – 48 A 53 19 06 45.910 +06 23 52.47 11.713 10.097 19.476 – 3331 31 33.6 85.7 1.68 0.25 50 A 55 19 10 25.768 −02 20 23.46 0.944 2.171 1.047 0.451 1311 54 10.8 6 2.98 0.78 52 A 57 19 17 05.733 +25 37 33.41 0.179 0.415 0.24 – 1311 36.9 2.2 – – – 53 A 58 19 18 20.476 +01 46 59.62 26.646 20.791 6.876 3.949 3331 – – – – – 54 A 59 19 18 40.003 +19 34 32.95 0.467 1.613 2.13 0.899 1311 86.7 13.7 18 1.69 0.71 56 A 60 19 19 17.819 −12 14 36.78 0.209 0.455 0.214 – 1311 74 – 11 2.07 0.74 59 A 63 19 42 10.372 +17 05 14.52 0.532 1.765 1.095 0.782 1311 40 4.5 – – – 63 A 68 20 00 10.607 +21 42 55.43 0.636 1.132 – 0.537 1311 – – – – – 67 A 71 20 32 24.243 +47 21 02.83 – 0.943 1.042 0.91 1311 158 – 82.8 0.84 0.64 69 A 73 20 56 27.032 +57 26 03.05 0.452 1.309 1.011 0.272 1311 73.2 11 7.4 2.31 0.82 71 A 75 21 26 23.540 +62 53 31.83 0.977 2.389 1.605 2.082 1311 56 19.3 17 2.04 0.55 75 A 8 05 06 38.378 +39 08 10.77 – 0.371 – – 1311 60 4.3 25.6 1.78 0.52 77 A 82 23 45 47.814 +57 03 59.22 0.249 0.755 2.635 1.16 1311 81 7.6 5.3 2.41 0.95 83 Al 2-E 17 30 14.398 −27 30 19.41 1.227 2.023 – 0.022 1311 – 14.7 – – – 91 Al 2-Q 17 53 25.040 −29 17 08.73 0.179 3.261 5.271 1.104 1311 – 2.3 – – – 94 Ap 1-12 18 11 35.088 −28 22 37.02 8.231 6.48 1.255 1.526 3311 12 6.6 18.7 5.34 0.31 95 Ap 2-1 18 58 10.459 +01 36 57.15 873.272 609.29 793.279 958.062 3333 40 195 320.4 1.13 0.22 97 BV 5-1 00 20 00.450 +62 59 03.16 1.283 1.029 1.138 2.259 1311 41.6 10.6 17.7 4.05 0.82 99 BV 5-3 01 53 03.432 +56 24 17.11 1.01 0.622 0.576 1.718 1311 – 2.7 – – – 102 Bl 2-1 22 20 16.638 +58 14 16.59 2.659 2.965 – 1.066 1311 1.6 21.6 54 6.94 0.05 105 Bl 3-15 17 52 35.947 −29 06 38.97 3.78 3.21 3.346 5.144 1311 – – – – – 106 Bl B 17 36 59.836 −29 40 08.93 5.691 5.45 6.249 2.798 1311 – 8.9 – – – 118 CTS 1 18 06 59.785 −08 55 32.80 4.706 4.048 0.471 1.589 3311 – 24 – – – 119 Cn 1-1 15 51 15.936 −48 44 58.67 13.214 10.516 4.745 0.806 3331 – – 10 – – 120 Cn 1-3 17 26 12.392 −44 11 24.52 3.458 3.029 – – 3311 – – – – – 122 Cn 1-5 18 29 11.653 −31 29 59.21 6.379 6.339 2.788 – 3311 7 51 44 4.43 0.15 123 Cn 2-1 17 54 32.978 −34 22 20.84 2.975 2.954 – 0.611 3311 2.2 25.2 49 6.17 0.07 124 Cn 3-1 18 17 34.133 +10 09 03.99 7.298 5.991 1.936 2.188 3311 4.5 59.5 75 4 0.09 127 Dd 1 20 08 43.080 +42 30 11.19 0.819 1.087 – – 1311 – – 6 – – 133 DuRe 1 12 45 51.211 −64 09 38.08 8.398 6.469 11.267 6.274 1331 – – – – – 138 ESO 040-11 13 34 14.128 −75 46 31.33 1.049 0.991 1.758 – 1311 – – – – – 150 Fg 1 11 28 36.205 −52 56 04.01 5.624 10.809 6.454 4.621 3331 16 – 55 2.02 0.16 151 Fg 2 17 39 19.847 −44 09 37.14 3.506 2.488 0.622 0.477 1311 – – – – – 152 Fg 3 18 00 11.819 −38 49 52.73 14.692 11.152 4.286 3.226 3331 2 42 107 – – 156 G001.6−05.9 18 13 15.842 −30 25 58.49 – 0.428 0.472 0.942 1311 – – – – – 158 G002.5+05.1 17 32 12.788 −24 04 59.56 15.981 11.822 3.348 1.594 3311 – – – – – 163 G009.3+05.7 17 45 14.155 −17 56 46.57 56.19 40.015 15.844 12.064 3333 – – – – – 164 G010.2+07.5 17 41 00.035 −16 18 12.50 1.362 0.956 – 1.539 1311 – – – – – 165 G011.1−07.9 18 40 19.914 −22 54 29.23 0.841 1.638 0.297 0.189 1311 – – – – – 168 G013.1−13.2 19 04 43.548 −23 26 08.82 21.108 13.815 4.63 2.404 3331 – – – – – 171 G014.4−06.1 18 39 40.056 −19 14 12.04 1.014 1.202 1.2 – 1311 – – – – – 175 G017.0+11.1 17 42 14.430 −08 43 18.61 5.365 5.666 1.605 0.349 3311 – 23.4 – – – 179 G019.2−04.4 18 42 24.770 −14 15 11.81 2.374 2.789 0.666 1.03 1311 – 7.3 – – – 181 G022.0−04.3 18 47 03.954 −11 41 11.74 8.676 8.306 2.024 1.337 3311 – 8.4 – – – 185 G034.5−11.7 19 36 17.531 −03 53 25.26 3.814 2.615 3.426 0.975 3311 – 8.8 – – – 186 G038.4+01.8 18 54 54.139 +05 48 11.29 – 2.998 – – 1311 – 20.5 – – – 188 G039.1−02.2 19 10 53.284 +04 27 28.50 1.248 2.49 – – 1311 – 11 – – – 191 G044.1+01.5 19 06 32.146 +10 43 23.93 1.413 3.034 4.193 – 1311 – 19.4 – – – 193 G047.2+01.7 19 11 35.828 +13 31 11.58 5.784 4.889 – – 3311 – – – – – 202 G069.2+01.2 20 00 41.998 +32 27 41.23 1.094 1.588 – – 1311 – 17 – – – 204 G076.6−05.7 20 48 16.627 +34 27 24.36 8.115 7.002 2.067 – 3311 – – – – – 207 G095.0−05.5 21 56 32.945 +47 36 13.40 0.858 0.472 – – 1311 – – – – – 211 G124.0+02.9 01 02 24.488 +65 46 32.81 2.184 2.741 4.239 3.567 1311 – 7.4 – – – 221 G222.8−04.2 06 54 13.406 −10 45 38.27 1.878 1.168 0.744 0.631 1311 – 2.7 – – – 226 G255.3−03.6 08 06 28.339 −38 53 23.93 1.622 1.085 0.289 1.12 1311 – 2.8 – – – 228 G260.1+00.2 08 37 24.599 −40 38 07.46 4.072 4.911 2.082 0.131 3311 – – – – – 229 G270.1−02.9 08 59 02.971 −50 23 39.68 1.001 1.265 – 1311 – – – – – 231 G277.1−01.5 09 37 51.861 −54 27 08.59 1.247 1.106 – – 1311 – – – – – 232 G279.1−00.4 09 53 27.058 −54 52 39.60 1.616 2.185 2.079 0.076 1311 – – – – – 234 G282.6−00.4 10 13 19.673 −56 55 32.24 3.692 3.317 6.231 1.671 1311 – – – – – 235 G285.1−02.7 10 19 32.466 −60 13 29.41 77.86 58.749 36.452 16.57 3333 – – – – – 236 G290.7+00.2 11 10 25.122 −60 15 36.85 10.823 13.328 28.365 19.063 3333 – – – – – 241 G308.5−03.5 13 46 25.712 −65 46 24.26 1.892 1.935 0.503 0.551 1311 – – – – – 246 G316.2+00.8 14 38 19.980 −59 11 46.12 17.965 12.604 7.104 2.124 3311 – – – – – 248 G326.4+01.0 15 19 43.867 −48 59 54.65 0.844 2.367 – 0.838 1311 – – – – – 251 G328.4−02.8 16 09 20.143 −55 36 09.84 10.647 9.904 5.721 6.032 3311 – – – – – 253 G331.3−12.1 17 16 21.107 −59 29 23.35 2.504 1.926 0.895 1.7 3311 – – – – – 264 G347.9−06.0 17 40 03.329 −42 24 05.58 1.674 1.07 – 0.135 1311 – – – – – 267 G351.5−06.5 17 52 09.386 −39 32 14.52 1.246 2.017 0.941 0.884 1311 – – – – –