MID- AND FAR-INFRARED PHOTOMETRY OF GALACTIC PNE 95

TABLE 2 (CONTINUED)

KN NAME R.A. (2000) DEC (2000) F (65 μm) F (90 μm) F (140 μm) F (160 μm) QUAL DIAM F (1.4 GHz) F(5 GHz) DIST DIAM

H:M:S D:M:S) Jy Jy Jy Jy arcsec mJy mJy kpc pc

270 G352.6−04.9 17 47 52.679 −37 48 03.10 0.685 0.733 – 1.812 1311 – 3.7 – – – 275 G353.6−03.6 17 44 35.434 −36 14 01.67 0.631 1.004 1.947 1.427 1311 – – – – – 294 G356.8−03.0 17 50 10.734 −33 14 17.97 4.956 2.522 0.54 4.026 1311 – 4.2 – – – 299 G358.3−07.3 18 11 39.900 −34 00 21.99 – 0.701 – 0.763 1311 – – – – – 302 G358.7+05.1 17 22 43.615 −27 13 36.67 7.125 4.881 3.383 2.801 3311 – – – – – 307 G359.4−08.5 18 19 26.331 −33 37 04.86 0.298 0.974 – 0.672 1311 – 4.5 – – – 310 G000.5+01.9 17 39 31.219 −27 27 46.77 5.529 3.087 3.93 10.456 1311 – 6.8 – – – 323 G003.1+04.1 17 37 20.167 −24 03 27.84 1.6 1.494 0.414 0.727 1311 – 5.1 – – – 326 G003.6+04.9 17 35 31.198 −23 11 47.62 0.551 1.164 2.137 – 1311 – 4.6 – – – 332 G035.4+03.4 18 43 36.599 +03 46 39.24 5.368 5.503 3.326 0.518 3311 – 5.1 – – – 359 H 1-11 17 21 17.693 −22 18 35.32 3.175 2.96 2.676 – 3311 6 20.7 13 7.27 0.21 367 H 1-19 17 30 02.546 −27 59 17.54 5.167 4.576 – 1.333 3311 1.4 11.6 26 8.19 0.06 368 H 1-2 16 48 54.091 −35 47 09.01 6.754 7.334 3.178 5.698 3331 1 14.3 62 – – 369 H 1-20 17 30 43.799 −28 04 06.68 3.73 3.436 – – 3311 3.3 26.9 43.9 5.12 0.08 372 H 1-23 17 32 46.897 −30 00 15.07 5.346 2.646 1.913 0.27 1311 2.6 24.5 34.8 6.12 0.08 373 H 1-24 17 33 37.565 −21 46 24.78 2.864 4.191 1.34 0.725 1311 5 5.1 15 7.32 0.18 375 H 1-27 17 40 17.926 −22 19 17.64 4.632 4.237 2.276 1.683 3311 5.2 – 18 10.9 0.27 376 H 1-28 17 42 54.066 −39 36 24.04 0.741 1.613 0.91 0.82 1311 – 5.4 – – – 378 H 1-3 16 53 31.347 −42 39 23.45 6.802 6.116 14.597 – 1311 15.8 – – 1.36 0.1 379 H 1-30 17 45 06.782 −38 08 49.48 0.047 2.454 2.628 1.4 1311 <5 7 81.3 5.21 – 380 H 1-31 17 45 32.104 −34 33 55.32 1.182 1.808 3.421 2.872 1311 0.7 6 16 11.8 0.04 385 H 1-36 17 49 48.172 −37 01 29.47 3.996 3.046 1.295 – 1311 0.8 11.8 50 – – 390 H 1-40 17 55 36.049 −30 33 32.08 8.689 7.947 3.121 2.002 3311 3 8.1 31 7.84 0.11 391 H 1-41 17 57 19.145 −34 09 49.12 1.409 2.46 – 1.307 1311 9.6 16.6 12 6.6 0.31 392 H 1-42 17 57 25.169 −33 35 42.94 1.873 2.163 1.065 1.6 1311 5.8 34.5 40 4.82 0.14 394 H 1-44 17 58 10.641 −31 42 56.08 3.517 3.355 – – 3311 <5 8 – – – 396 H 1-46 17 59 02.490 −32 21 43.42 2.175 1.824 1.577 – 3311 1.2 18.3 43 7.11 0.04 399 H 1-50 18 03 53.461 −32 41 42.15 2.527 1.911 0.001 – 3311 1.4 19.6 31 7.68 0.05 404 H 1-55 18 07 14.542 −29 41 24.51 2.607 2.827 4.162 1.519 1311 10 2.5 5.3 – – 405 H 1-56 18 07 53.880 −29 44 34.26 1.409 1.586 1.4 – 1311 3 8.3 7.8 10.98 0.16 408 H 1-59 18 11 29.263 −27 46 15.69 1.006 1.115 0.501 – 1311 6 3.4 4.2 11.12 0.32 412 H 1-62 18 13 17.951 −32 19 42.74 4.164 3.569 – 2.715 3311 – 11.9 – – – 413 H 1-63 18 16 19.336 −30 07 35.98 1.399 0.981 – 1.129 1311 – 2.5 9 – – 416 H 1-66 18 24 57.539 −25 41 55.76 1.68 2.448 2.442 4.279 1313 <10 10.4 6 9.5 – 417 H 1-67 18 25 04.976 −22 34 52.64 1.245 1.916 2.312 – 1311 6 12.2 11.9 7.51 0.22 418 H 1-7 17 10 27.389 −41 52 49.42 – 42.37 33.76 10.955 131 – – – – – 429 H 2-17 17 40 07.428 −24 25 42.57 3.915 2.947 1.795 – 3311 4 8.2 10 8.88 0.17 437 H 2-27 17 51 50.576 −33 47 35.59 2.026 4.543 5.283 3.193 1311 – 7.9 – – – 438 H 2-29 17 53 16.794 −32 40 38.56 0.841 1.959 1.309 0.054 1311 – 2.6 – – – 442 H 2-33 17 58 12.535 −31 08 05.99 1.633 2.283 – – 1311 8 8.1 5 9.71 0.38 443 H 2-35 18 00 18.259 −34 27 39.29 0.161 0.981 2.435 0.421 1311 – – – – – 444 H 2-36 18 04 07.936 −31 39 13.70 0.939 1.627 1.844 1.4 1311 – 3.4 – – – 449 H 2-42 18 12 23.255 −26 32 54.02 1.024 1.992 0.43 3.923 1311 – 3.1 – – – 453 H 2-46 18 18 37.444 −31 54 45.42 0.751 0.772 – 2.136 1311 25 – – – – 454 H 2-48 18 46 35.149 −23 26 48.24 3.332 2.115 1.08 – 3311 2 31.6 66 6.23 0.06 456 H 2-8 17 24 45.766 −21 33 35.80 – 0.443 2.309 – 1311 – 4.8 – – – 457 H 3-29 04 37 23.484 +25 02 40.94 2.391 1.128 – 3.097 1311 21 18.3 18 3.4 0.35 463 HaTr 13 19 08 02.149 +02 21 24.25 0.226 1.281 0.982 1.832 1311 – 3.6 – – – 464 HaTr 14 19 09 13.670 +07 05 44.86 1.974 1.872 – – 1311 – – – – – 465 HaTr 2 15 30 18.542 −61 01 38.79 0.808 1.883 1.534 – 1311 – – – – – 467 HaTr 4 16 45 00.155 −51 12 19.83 0.422 1.93 3.937 3.937 1331 – – – – – 474 Hb 12 23 26 14.814 +58 10 54.65 28.818 19.707 6.499 3.075 3331 0.8 – 45 10.46 0.04 475 Hb 4 17 41 52.763 −24 42 08.07 13.541 14.269 0.952 1.287 3311 7.3 157.6 170 2.68 0.09 477 Hb 6 17 55 07.023 −21 44 39.98 20.768 14.246 6.261 2.636 1311 6 190.5 243 2.45 0.07 479 He 1-1 19 23 46.875 +21 06 38.60 1.896 2.307 – – 1311 8 16 14 – – 480 He 1-2 19 26 37.757 +21 09 27.04 4.268 3.83 3.69 2.034 3311 4.7 14.6 15 – – 481 He 1-3 19 48 26.422 +22 08 37.62 3.687 3.402 – – 1311 8 53.5 – – – 482 He 1-4 19 59 18.014 +31 54 39.14 2.196 3.218 – – 3311 – 16.1 – – – 484 He 1-6 20 17 21.424 +25 21 46.78 – 0.59 0.228 – 1311 22.4 5 20.3 2.91 0.32 486 He 2-102 13 58 13.866 −58 54 31.78 3.526 5.212 – 0.187 3311 9 – 33 3.77 0.16 487 He 2-104 14 11 52.077 −51 26 24.18 5.304 5.412 2.607 1.568 3311 5 – 15 – – 488 He 2-105 14 15 24.803 −74 12 46.61 2.007 2.755 0.431 0.625 1311 31 – 14 2.67 0.4 490 He 2-108 14 18 08.889 −52 10 39.76 11.056 11.255 2.98 – 3311 11 – 32 3.49 0.19 491 He 2-109 14 20 48.916 −55 27 59.21 0.507 0.868 1.644 1.676 1311 7.4 – 15.8 6.41 0.23 492 He 2-11 08 37 08.445 −39 25 08.09 14.232 29.419 9.803 8.864 3333 65 343.6 444.6 0.77 0.24 494 He 2-112 14 40 30.924 −52 34 56.66 5.436 5.861 2.376 1.855 3311 14.6 – 82 2.36 0.17 495 He 2-113 14 59 53.523 −54 18 07.20 146.924 75.968 29.685 20.859 3333 – – 115 – – 496 He 2-114 15 04 08.800 −60 53 18.78 2.378 3.831 2.893 13.696 1331 36.6 – 11 2.8 0.5 497 He 2-115 15 05 16.775 −55 11 10.39 9.04 7.229 3.019 0.869 3311 3 – 156 3.91 0.06 499 He 2-117 15 05 59.193 −55 59 16.53 30.411 20.756 7.71 – 3331 5 – 267 2.69 0.07 503 He 2-123 15 22 19.360 −54 08 12.77 13.454 14.537 6.106 5.808 3331 4.6 – 110 3.59 0.08 504 He 2-125 15 23 36.326 −53 51 27.95 2.858 3.458 1.854 0.569 1311 3 – 20.4 6.96 0.1 505 He 2-128 15 25 07.841 −51 19 42.29 1.343 1.317 – 2.54 1311 5 – 40 – – 506 He 2-129 15 25 32.677 −52 50 37.96 1.332 1.958 0.083 1.087 1311 1.6 – 35 7.85 0.06 507 He 2-131 15 37 11.210 −71 54 52.89 52.897 32.153 10.413 6.777 3331 6 – 325 2.2 0.06 508 He 2-132 15 38 01.182 −58 44 42.07 5.143 6.911 3.164 – 3311 17.8 – 25 3.02 0.26 509 He 2-133 15 41 58.788 −56 36 25.72 19.455 12.659 2.857 3.351 3311 <10 – 210 3.18 – 510 He 2-136 15 52 10.666 −62 30 46.94 – 1.052 – – 1311 10 – 23 – – 511 He 2-138 15 56 01.694 −66 09 09.23 37.174 27.055 8.317 5.173 3333 7 – 76 3.61 0.12 512 He 2-140 15 58 08.063 −55 41 50.13 11.771 8.42 – 0.219 1311 2.6 – 80 5.03 0.06 513 He 2-141 15 59 08.762 −58 23 53.15 2.406 2.797 0.987 1.007 3311 13.8 – 51 2.77 0.19 514 He 2-142 15 59 57.608 −55 55 32.89 8.916 8.153 1.037 0.116 1311 3.6 – 65 4.75 0.08 519 He 2-149 16 14 24.266 −54 47 38.82 – 1.02 – – 1311 3 – 10 8.52 0.12 520 He 2-15 08 53 30.701 −40 03 42.08 8.855 13.475 7.766 8.121 3331 23.8 94.5 105 1.92 0.22 521 He 2-151 16 15 42.269 −59 54 00.96 4.698 3.035 – – 3311 5 – 10 – – 522 He 2-152 16 15 20.031 −49 13 20.76 59.168 34.701 25.057 26.453 1333 11 – 196 2.09 0.11