MID- AND FAR-INFRARED PHOTOMETRY OF GALACTIC PNE 97

TABLE 2 (CONTINUED)

KN NAME R.A. (2000) DEC (2000) F (65 μm) F (90 μm) F (140 μm) F (160 μm) QUAL DIAM F (1.4 GHz) F(5 GHz) DIST DIAM

H:M:S D:M:S) Jy Jy Jy Jy arcsec mJy mJy kpc pc

644 J 900 06 25 57.275 +17 47 27.19 5.565 4.194 2.942 1.558 3311 6 107.8 100 3.29 0.1 651 KFL 13 18 12 44.988 −25 44 23.85 0.222 1.359 – 1.112 1311 – 4 3.5 – – 652 KFL 14 18 13 01.106 −29 25 15.59 0.088 0.977 0.676 – 1311 – – 1.5 – – 660 KFL 9 18 07 19.381 −31 42 56.95 – 0.838 – – 1311 – 2.8 3.1 – – 666 K 1-14 17 42 36.757 +21 27 02.06 0.454 0.708 0.813 0.763 1311 47 – – – – 669 K 1-17 19 03 37.362 +19 21 22.60 0.61 1.071 0.621 2.994 1311 45 4.6 – – – 672 K 1-21 08 04 14.193 −34 16 07.32 0.272 0.796 – – 1311 29 6.5 5 3.88 0.55 681 K 2-16 16 44 49.050 −28 04 04.56 22.836 17.837 4.856 1.122 3331 – – – – – 684 K 2-5 17 54 26.179 −12 48 35.95 0.181 0.551 2.464 2.452 1311 24.6 4 3 – – 686 K 3-1 18 23 21.721 +03 36 27.78 0.22 0.637 0.399 4.204 1311 5 5.4 5 8.31 0.2 687 K 3-11 18 41 07.311 −08 55 58.97 8.769 4.539 1.898 14.47 3111 3 14.5 17 7.33 0.11 693 K 3-18 19 00 34.829 −02 11 57.62 4.782 4.264 – – 3311 3.5 – 11 13.98 0.23 695 K 3-2 18 25 00.576 −01 30 52.64 2.934 1.956 – – 3311 2.8 25.9 31 6.37 0.09 696 K 3-20 19 02 10.154 −01 48 45.31 1.358 1.085 0.791 – 1311 – 6.3 – – – 697 K 3-21 19 02 40.327 +14 28 50.36 0.15 0.373 – 0.189 1311 – – – – – 699 K 3-24 19 12 05.820 +15 09 04.47 1.402 1.896 1.19 1.693 1311 6.2 8.5 – – – 700 K 3-26 19 14 39.178 +00 13 36.29 1.422 1.442 – – 1311 – 6.4 0.5 – – 702 K 3-29 19 15 30.561 +14 03 49.83 5.471 5.005 – – 1311 1 13.9 65 8.07 0.04 703 K 3-3 18 27 09.338 +01 14 26.88 5.058 7.101 1.615 2.432 3311 10 35.9 34 3.43 0.17 704 K 3-30 19 16 27.691 +05 13 19.47 0.539 1.423 4.218 1.382 1311 3.3 12.1 23 6.46 0.1 705 K 3-31 19 19 02.666 +19 02 20.85 1.665 1.718 – – 1311 1.5 16.8 39 7.83 0.06 708 K 3-35 19 27 44.036 +21 30 03.83 37.657 19.471 4.673 0.634 3311 1.7 14.5 60 6.56 0.05 709 K 3-36 19 32 39.557 +07 27 51.57 0.342 1.393 1.147 2.954 1311 – 3.1 0.2 – – 710 K 3-37 19 33 46.749 +24 32 27.09 0.797 0.821 0.198 1.414 1311 2.5 14.4 17 7.93 0.1 711 K 3-38 19 35 18.354 +17 13 00.71 3.674 4.207 4.376 5.177 3311 5 28.7 31 5.09 0.12 712 K 3-39 19 35 54.469 +24 54 48.20 3.351 2.565 0.402 1.241 3311 1 3.6 11 13.35 0.06 713 K 3-4 18 31 00.227 +02 25 27.35 3.694 2.055 4.661 0.696 1311 21 17 21 – – 714 K 3-40 19 36 21.828 +23 39 47.93 3.452 3.892 – – 3311 4 17.1 20 6.18 0.12 717 K 3-43 19 40 25.908 +18 49 14.20 0.482 0.69 0.122 – 1311 3 4.8 0.4 – – 720 K 3-49 19 54 00.702 +33 22 12.95 1.097 1.077 – – 1311 – 5.5 7 34.5 – 721 K 3-5 18 31 45.833 +04 05 09.12 1.543 1.481 2.463 2.296 1311 10 6.7 3 7.11 0.34 723 K 3-52 20 03 11.435 +30 32 34.15 35.941 24.008 10.002 8.825 3331 0.7 16.9 65 9.42 0.03 724 K 3-53 20 03 22.475 +27 00 54.73 5.133 4.756 0.601 – 3311 0.9 10 69 9.27 0.04 726 K 3-55 20 06 56.210 +32 16 33.60 5.551 7.453 7.527 6.486 1311 8.2 86.6 90 2.96 0.12 728 K 3-57 20 12 47.679 +34 20 32.52 2.474 3.289 1.827 – 1311 6.3 46.8 60 3.72 0.11 729 K 3-58 20 21 58.324 +29 59 22.15 2.219 3.014 2.792 1.481 1311 4.8 5.4 – – – 730 K 3-6 18 33 17.490 +00 11 47.19 5.499 4.908 4.12 2.52 3311 0.7 10.4 55 10.2 0.03 732 K 3-61 21 30 00.710 +54 27 27.45 1.973 1.628 – 0.663 1311 6 16.6 14 5.73 0.17 733 K 3-62 21 31 50.203 +52 33 51.64 4.669 3.505 – – 3311 2.5 59.5 115 4.62 0.06 734 K 3-63 21 39 11.976 +55 46 03.94 0.395 1.098 1.335 – 1311 7 8.5 29 – – 735 K 3-64 04 13 27.255 +51 51 00.92 – 0.392 0.082 0.596 1311 – – – – – 737 K 3-66 04 36 37.243 +33 39 29.87 1.272 0.594 0.104 0.766 1311 2.1 15.4 18 8.42 0.09 738 K 3-67 04 39 47.905 +36 45 42.85 1.832 1.82 – – 1311 2.2 33.3 42 6.49 0.07 740 K 3-69 05 41 22.147 +39 15 08.09 1.857 2.087 2.649 – 3311 0.5 2.9 0.4 13.87 0.03 741 K 3-7 18 34 13.601 −02 27 36.41 4.976 4.56 – – 1311 6.3 29.5 30 4.52 0.14 742 K 3-70 05 58 45.350 +25 18 43.86 1.236 1.558 2.457 – 1311 1.6 4.4 6 – – 746 K 3-76 20 25 04.865 +33 34 50.70 2.488 2.112 – 3.736 1311 0.2 5.1 12 – – 747 K 3-78 20 45 22.710 +50 22 39.92 1.991 2.624 0.09 1.142 1311 3.8 14.9 15 6.85 0.13 750 K 3-82 21 30 51.636 +50 00 06.96 2.461 3.525 2.515 1.426 3311 24 35.6 30 2.49 0.29 751 K 3-83 21 35 43.877 +50 54 16.94 1.27 1.835 – – 1311 5 4.7 6.5 7.71 0.19 752 K 3-84 21 38 49.006 +46 00 27.81 0.705 0.608 0.535 – 1311 – 2.7 – – – 754 K 3-88 23 12 15.494 +64 39 17.73 0.599 0.948 – 0.494 1311 – 7.1 0.3 – – 755 K 3-90 01 24 58.628 +65 38 36.14 1.083 0.569 – – 1311 8.5 12.4 13.9 4.6 0.19 757 K 3-92 02 03 41.171 +64 57 37.88 0.237 0.527 – 0.724 1311 13 – 2 7.11 0.45 759 K 3-94 03 36 08.086 +60 03 46.29 0.364 1.022 1.299 0.377 1311 10 6.9 5.5 5.98 0.29 761 K 4-19 19 13 22.624 +03 25 00.30 2.142 1.463 0.425 – 3311 – – – – – 764 K 4-41 19 56 34.027 +32 22 12.96 2.439 2.5 0.831 0.145 3311 3 11.5 15 7.59 0.11 765 K 4-47 04 20 45.157 +56 18 11.57 5.138 5.585 3.408 1.143 1331 7.8 – 7.7 22.46 0.85 766 K 4-48 06 39 55.879 +11 06 30.69 3.627 3.673 0.833 – 3311 2.2 11.8 14 8.86 0.09 768 K 4-53 20 42 16.744 +37 40 25.58 3.45 5.024 0.89 0.592 3311 – 34.4 – – – 769 K 4-55 20 45 10.021 +44 39 14.58 0.211 1.688 – – 1311 – 6.2 – – – 775 KjPn 6 22 49 02.175 +67 01 38.89 0.518 0.873 1.165 1.764 1311 – 8 – – – 779 LoTr 10 14 46 20.239 −61 13 35.37 4.579 2.985 2.254 2.351 1311 – – – – – 782 LoTr 7 14 15 24.025 −67 31 55.87 0.13 0.861 1.249 1.025 1311 – – – – – 787 Lo 11 16 03 22.211 −36 00 53.73 0.205 1.758 1.073 – 1311 – 2.7 3.5 – – 790 Lo 16 17 35 41.798 −40 11 26.20 3.656 10.988 4.495 10.058 3311 – 89.9 – – – 797 Lo 9 15 42 13.340 −47 40 46.33 0.121 0.63 – 0.09 1311 – – – – – 798 MA 13 18 30 30.388 −07 27 38.29 10.933 5.667 – – 3311 – 28.7 – – – 799 MA 2 18 15 13.391 −06 57 12.20 1.006 1.304 0.076 0.792 1311 – 7.4 – – – 802 M 1-1 01 37 19.430 +50 28 11.50 0.993 0.51 – 1.437 1311 4.5 14 8 7.27 0.16 803 M 1-11 07 11 16.693 −19 51 02.87 18.8 15.084 3.463 1.214 3311 2.2 25.9 113 4.9 0.05 804 M 1-12 07 19 21.471 −21 43 55.46 3.723 2.383 1.515 – 3311 1.8 21.9 41 7.13 0.06 805 M 1-13 07 21 14.952 −18 08 36.91 2.662 4.368 3.749 – 1311 10 18.9 15 4.51 0.22 806 M 1-14 07 27 56.510 −20 13 22.89 2.101 1.844 1.666 0.876 3311 4.7 59.1 60 4.23 0.1 807 M 1-16 07 37 18.955 −09 38 49.67 8.731 7.022 7.089 6.625 3331 3.6 31.3 31 5.71 0.1 808 M 1-17 07 40 22.206 −11 32 29.81 3.93 3.522 2.095 3.194 3311 2.5 18.3 17 8.23 0.1 811 M 1-2 01 58 49.675 +52 53 48.57 1.513 1.075 0.416 0.094 1311 0.5 – 10 – – 812 M 1-22 17 35 10.239 −18 34 20.41 2.072 1.918 – 2.497 1311 6 7.4 3.5 11.92 0.35 813 M 1-23 17 37 22.003 −18 46 41.87 2.195 3.146 2.712 – 1311 – 14.1 – – – 814 M 1-24 17 38 11.588 −19 37 37.64 7.928 7.466 0.478 0.707 3311 <10 43.5 – – – 815 M 1-25 17 38 30.307 −22 08 38.88 6.244 6.016 0.689 – 3311 3.2 39.9 57 4.93 0.08 819 M 1-30 17 52 58.946 −34 38 22.99 5.714 5.292 – – 3311 3.5 23.4 31 5.9 0.1 822 M 1-33 17 58 58.794 −15 32 14.79 6.185 7.632 – 3.584 3311 4 49 60 4.63 0.09 823 M 1-34 18 01 22.193 −33 17 43.08 2.006 3.779 1.363 7.131 1311 11.2 13.6 14.7 5.95 0.32 826 M 1-38 18 06 05.765 −28 40 29.28 – 3.022 – – 1311 3.5 14.9 24 6.58 0.11 828 M 1-4 03 41 43.428 +52 17 00.28 2.201 2.263 – – 3311 6 77.8 90 3.39 0.1