98 PHILLIPS & MÁRQUEZ-LUGO

TABLE 2 (CONTINUED)

KN NAME R.A. (2000) DEC (2000) F (65 μm) F (90 μm) F (140 μm) F (160 μm) QUAL DIAM F (1.4 GHz) F(5 GHz) DIST DIAM

H:M:S D:M:S) Jy Jy Jy Jy arcsec mJy mJy kpc pc

829 M 1-40 18 08 25.994 −22 16 53.25 44.078 20.96 – 7.625 3311 4.5 163.3 208 2.83 0.06 831 M 1-42 18 11 05.028 −28 58 59.33 5.007 7.279 8.013 4.503 3331 9 28.3 28.5 4.89 0.21 833 M 1-44 18 16 17.365 −27 04 32.47 5.194 5.412 6.768 2.805 1131 4 9.4 9 9.24 0.18 835 M 1-46 18 27 56.339 −15 32 54.43 19.466 12.055 3.57 4.934 3311 11.5 78.1 81 2.58 0.14 836 M 1-47 18 29 11.154 −21 46 53.43 1.007 1.099 – – 1311 5.5 11.7 14 5.95 0.16 837 M 1-48 18 29 29.991 −19 05 44.58 1.291 2.036 2.169 1.771 1311 4.8 5 6 7.57 0.18 838 M 1-5 05 46 50.000 +24 22 02.32 2.046 1.733 0.522 – 1311 2.3 41.1 71 5.49 0.06 839 M 1-50 18 33 20.886 −18 16 36.86 2.416 3.361 0.749 0.299 1311 5.6 35.4 50 4.12 0.11 842 M 1-53 18 35 48.267 −17 36 08.71 3.355 4.38 4.325 0.782 3331 6 19.6 8 3.93 0.11 843 M 1-54 18 36 08.357 −16 59 57.02 5.805 6.572 5.373 4.726 3331 13 35.5 53 3.09 0.19 845 M 1-56 18 37 46.250 −17 05 46.55 3.028 3.273 0.56 3.358 3311 1.5 14.6 22 9.48 0.07 847 M 1-58 18 42 56.979 −11 06 53.10 5.187 4.822 – 0.323 3311 6.4 37.7 60 3.69 0.11 849 M 1-6 06 35 45.140 −00 05 37.37 3.831 2.361 3.46 – 3111 3 54.4 86 4.7 0.07 850 M 1-60 18 43 38.107 −13 44 48.64 6.538 6.621 0.146 1.54 3311 2.5 35.1 48 5.81 0.07 851 M 1-61 18 45 55.072 −14 27 37.93 11.311 9.759 – 1.401 3311 1.8 32.5 97 5.59 0.05 853 M 1-63 18 51 30.935 −13 10 36.81 1.535 1.661 1.588 – 1311 4.2 8.4 10.2 7.32 0.15 854 M 1-64 18 50 02.090 +35 14 36.10 0.761 0.51 0.321 2.018 1311 17 4.3 2.4 6 0.49 855 M 1-65 18 56 33.639 +10 52 10.05 2.434 1.681 1.962 0.76 3311 4 21 23 5.94 0.12 856 M 1-66 18 58 26.247 −01 03 45.70 2.414 2.583 – 14.087 1311 2.7 45.7 59 5.39 0.07 857 M 1-67 19 11 30.881 +16 51 38.21 26.235 28.609 16.751 8.822 3333 120.4 217.6 250 0.69 0.4 858 M 1-69 19 13 53.961 +03 37 41.90 3.234 3.032 – – 3311 – 31.4 – – – 859 M 1-7 06 37 20.955 +24 00 35.38 3.427 5.261 4.004 2.22 3331 11 18.5 13 4.5 0.24 860 M 1-71 19 36 26.927 +19 42 23.99 14.339 11.593 3.032 4.86 1311 3 83.8 204 – – 861 M 1-72 19 41 33.975 +17 45 17.71 3.039 2.61 – 0.131 3311 0.7 5.3 30 12.54 0.04 862 M 1-73 19 41 09.323 +14 56 59.37 6.896 7.01 2.241 – 3311 6 47.7 43 4.17 0.12 863 M 1-74 19 42 18.874 +15 09 08.16 2.335 1.682 – – 1311 1 7.9 29 10.15 0.05 865 M 1-77 21 19 07.360 +46 18 47.24 8.792 7.776 1.68 0.532 3311 8 29.4 25 4.29 0.17 866 M 1-78 21 20 44.809 +51 53 27.88 843.838 742.643 243.538 250.943 1133 6 363.5 1103.9 1.62 0.05 867 M 1-79 21 37 01.500 +48 56 02.62 1.384 3.435 2.012 1.02 1311 31 21.8 19 2.62 0.39 868 M 1-8 06 53 33.795 +03 08 26.96 2.242 3.569 2.483 0.837 3311 18.4 16.3 23 3.06 0.27 869 M 1-80 22 56 19.806 +57 09 20.68 0.845 0.859 – – 1311 8 17.9 25 4.29 0.17 870 M 1-9 07 05 19.204 +02 46 59.16 1.085 0.68 – 0.802 1311 2.3 22.4 27 7.22 0.08 871 M 2-10 17 14 07.022 −31 19 42.59 3.438 3.612 – 0.79 3311 2.2 11.6 9.1 10.71 0.11 872 M 2-11 17 20 33.252 −29 00 38.66 0.775 1.457 1.927 1.417 1311 2.2 17.4 22 7.32 0.08 873 M 2-12 17 24 01.451 −25 59 23.16 3.449 2.817 – 1.752 3311 4.4 10.3 12.9 – – 875 M 2-14 17 41 57.252 −24 11 15.64 7.255 7.444 0.303 – 3311 2.2 22.4 39.1 – – 876 M 2-15 17 46 54.449 −16 17 24.80 2.663 3.981 0.105 – 3311 7.4 18.7 12.5 5.37 0.19 877 M 2-16 17 52 34.362 −32 45 51.10 1.819 4.33 0.702 – 1311 2.5 20.4 24.8 5.86 0.07 881 M 2-2 04 13 15.045 +56 56 58.08 3.482 3.28 – 0.761 3311 6.5 52 54 3.66 0.12 886 M 2-24 18 02 02.881 −34 27 47.07 3.003 3.345 0.489 0.747 3311 6.8 3.2 3 11.79 0.39 889 M 2-27 18 03 52.588 −31 17 46.54 5.258 5.361 1.533 – 3311 3.8 22.5 50 5.65 0.1 892 M 2-30 18 12 34.414 −27 58 11.59 1.596 2.289 3.75 2.127 1311 3.5 13.9 14 8.1 0.14 893 M 2-31 18 13 16.026 −25 30 04.97 3.561 3.598 – 0.951 3311 4 39.6 51 4.91 0.1 895 M 2-33 18 15 06.534 −30 15 32.89 1.963 1.768 2.255 0.189 1331 5 11.9 12 8.52 0.21 896 M 2-34 18 17 15.947 −23 58 54.51 1.342 2.897 – – 1311 <25 4.8 – – – 897 M 2-35 18 17 37.195 −31 56 46.86 – 0.643 – 0.424 1311 – – – – – 898 M 2-36 18 17 41.418 −29 08 19.59 3.903 3.904 0.449 1.042 3311 6.8 22.6 13 6.99 0.23 899 M 2-37 18 18 38.352 −28 08 01.00 0.83 1.565 2.636 – 1331 – – – – – 901 M 2-39 18 22 01.148 −24 10 40.18 2.212 1.762 0.729 – 3311 3.2 7.2 8 10.21 0.16 902 M 2-4 17 01 06.231 −34 49 38.58 3.778 3.978 0.977 – 3311 2 24.5 32 7.15 0.07 903 M 2-40 18 21 23.851 −06 01 55.79 7.267 7.246 3.168 – 1311 5.5 45.5 33 4.67 0.12 904 M 2-41 18 22 34.379 −30 43 29.66 1.289 1 0.666 2.018 1311 – 3 – – – 905 M 2-42 18 22 32.020 −24 09 28.40 1.337 1.655 1.41 – 1311 3.9 9.6 14 7.83 0.15 906 M 2-43 18 26 40.048 −02 42 57.63 13.475 9.881 4.454 0.769 3331 1.5 20.4 237 5 0.04 907 M 2-44 18 37 36.908 −03 05 55.96 5.521 5.483 – 2.237 1311 8 48.3 54 3.45 0.13 909 M 2-46 18 46 34.620 −08 28 01.85 2.976 4.938 2.008 2.894 3311 4.4 13.1 12 6.48 0.14 910 M 2-47 19 13 34.559 +04 38 04.45 3.707 4.756 0.071 0.869 3311 6 38.3 45 4.12 0.12 913 M 2-5 17 02 19.069 −33 10 05.01 5.407 5.084 2.977 – 3311 5 14.1 12 7.69 0.19 914 M 2-50 21 57 41.814 +51 41 39.01 0.367 0.487 – 0.47 1311 4.6 8.2 6.5 8.07 0.18 915 M 2-51 22 16 03.890 +57 28 33.75 2.498 5.809 7.035 6.729 3331 39.2 27.2 40.6 1.88 0.36 917 M 2-53 22 32 17.720 +56 10 26.12 1.772 2.662 1.949 1.464 1311 18 14.6 11 3.64 0.32 918 M 2-54 22 51 38.923 +51 50 42.50 4.945 3.546 0.724 0.357 3311 – 5.4 8 14.61 – 919 M 2-55 23 31 52.708 +70 22 10.11 1.845 3.756 3.575 1.759 1331 41 25.4 19 2.31 0.46 921 M 2-7 17 05 13.729 −30 32 18.46 1.162 1.162 1.019 – 1311 <25 6 7 8.55 – 924 M 3-1 07 02 49.980 −31 35 31.50 0.68 1.457 0.27 1.05 1311 11.2 25.7 24 3.78 0.21 925 M 3-10 17 27 20.152 −28 27 51.15 2.65 2.658 – 2.107 1311 3.1 35.2 29 6.33 0.1 926 M 3-12 17 36 22.634 −21 31 12.22 2.522 2.64 0.961 0.396 3311 7.5 11.2 12.5 6.98 0.25 927 M 3-13 17 41 36.594 −22 13 02.46 1.684 1.432 – – 1311 <7 – – – – 933 M 3-20 17 59 19.318 −28 13 48.05 1.786 1.353 – – 1311 4 16.2 40 5.3 0.1 934 M 3-21 18 02 32.324 −36 39 12.24 2.846 2.546 1.57 0.155 3311 <5 15.6 30 5.57 – 935 M 3-22 18 02 19.238 −30 14 25.38 1.334 1.319 0.941 0.998 1311 6.4 10.1 8.7 8.45 0.26 937 M 3-24 18 07 53.914 −25 24 02.71 5.998 3.891 0.071 – 3311 <25 17.4 – – – 938 M 3-25 18 15 16.967 −10 10 09.47 10.367 9.618 3.429 10.727 3311 1.5 25 76 6.89 0.05 940 M 3-27 18 27 48.273 +14 29 06.06 1.087 0.606 2.032 – 1311 1 – 53.2 8.55 0.04 942 M 3-29 18 39 25.772 −30 40 36.71 0.337 0.899 0.928 0.985 1311 8.2 7.6 18.7 5.86 0.23 943 M 3-3 07 26 34.228 −05 21 52.16 0.185 0.596 0.466 – 1311 12.2 – 5.6 5.46 0.32 944 M 3-30 18 41 14.938 −15 33 43.58 2.824 3.184 – – 3311 17.2 8.5 7 3.97 0.33 946 M 3-32 18 44 43.127 −25 21 33.85 2.932 2.875 3.04 0.488 3311 7.5 12.2 12 7.06 0.26 947 M 3-33 18 48 12.131 −25 28 52.39 2.216 1.695 – – 1311 6 9.8 7.5 8.94 0.26 948 M 3-34 19 27 01.897 −06 35 04.63 2.664 2.402 0.475 0.162 1311 8 29.6 29 4.12 0.16 949 M 3-35 20 21 03.769 +32 29 23.86 4.837 3.65 – – 3311 1.5 29.5 140 5.62 0.04 950 M 3-36 17 12 39.152 −25 43 37.39 1.387 1.603 1.946 2.054 1311 3.2 4.9 3.5 13.92 0.22 952 M 3-38 17 21 04.459 −29 02 59.21 6.63 5.961 0.778 0.384 3311 1.8 7.6 21 8.29 0.07 953 M 3-39 17 21 11.505 −27 11 38.13 22.638 24.194 7.809 1.158 3331 19 279.4 280 1.7 0.16 954 M 3-4 07 55 11.398 −23 38 12.46 1.061 1.155 0.983 0.47 1311 13.5 6.3 2.4 6.58 0.43 955 M 3-40 17 22 28.272 −27 08 42.40 5.041 4.717 3.036 2.794 3331 2.6 15.6 17 8.22 0.1