100 PHILLIPS & MÁRQUEZ-LUGO

TABLE 2 (CONTINUED)

KN NAME R.A. (2000) DEC (2000) F (65 μm) F (90 μm) F (140 μm) F (160 μm) QUAL DIAM F (1.4 GHz) F(5 GHz) DIST DIAM

H:M:S D:M:S) Jy Jy Jy Jy arcsec mJy mJy kpc pc

1098 NGC 7354 22 40 19.940 +61 17 08.10 33.268 30.543 9.496 4.222 3331 20 581 579 1.19 0.12 1099 NGC 7662 23 25 53.968 +42 32 05.04 22.148 21.669 6.041 4.011 3331 20 611.5 631 1.17 0.11 1100 Na 1 17 12 51.900 −03 16 00.13 1.755 2.016 0.027 – 1311 8 23 22.5 4.2 0.16 1104 PBOZ 34 18 05 25.509 −25 13 37.23 1.296 5.988 1.724 – 1311 – 20.8 52 – – 1105 PB 1 07 02 46.764 −13 42 34.65 1.675 1.619 1.828 – 1311 – 11.9 18 – – 1106 PB 10 19 28 14.391 +12 19 36.17 5.336 6.444 4.651 – 3311 8 50.4 50 3.53 0.14 1107 PB 2 08 20 40.188 −46 22 58.82 0.882 0.718 – – 1311 3 – 40 5.75 0.08 1108 PB 3 08 54 18.323 −50 32 22.34 4.526 4.492 2.307 2.818 3311 7 – 70 3.4 0.12 1109 PB 4 09 15 07.747 −54 52 43.78 4.735 6.393 2.352 0.322 3311 11.2 – 71 2.81 0.15 1110 PB 5 09 16 09.613 −45 28 42.79 9.504 7.797 2.42 3.249 3331 5 – 107 – – 1111 PB 6 10 13 15.949 −50 19 59.28 3.869 3.036 1.924 – 3311 11 – 30 3.55 0.19 1112 PB 8 11 33 17.717 −57 06 14.00 5.599 5.831 1.735 – 3311 5 – 27 5.15 0.12 1113 PB 9 19 27 44.814 +10 24 20.82 1.854 2.683 2.603 – 1311 7 33.1 40 3.57 0.12 1114 PC 11 16 37 42.697 −55 42 26.49 0.536 1.411 0.574 – 1311 5 – 11 – – 1116 PC 13 16 50 17.108 −30 19 55.50 0.441 1.149 – – 1311 – 6.6 – – – 1117 PC 14 17 06 14.767 −52 30 00.40 1.694 2.376 2.814 0.399 1331 7 – 30 4.32 0.15 1118 PC 17 17 35 41.677 −46 59 48.54 2.489 1.923 0.244 0.629 1311 5 – 14.7 6.12 0.15 1119 PC 19 18 24 44.524 +02 29 28.10 1.632 0.877 0.617 0.512 1311 2.8 22.4 25.3 6.75 0.09 1120 PC 20 18 43 03.456 −00 16 37.02 8.889 7.243 – 2.627 1311 – 27.3 – – – 1121 PC 21 18 45 35.215 −20 34 58.32 1.961 2.703 2.015 1.245 3311 13.4 11.2 – – – 1122 PC 22 19 42 03.514 +13 50 37.33 1.509 1.767 – – 1311 – 9.2 – – – 1124 PC 24 20 19 38.133 +27 00 11.23 2.484 2.735 1.285 – 1311 5 17.1 18 5.78 0.14 1127 PM 1-188 17 54 21.100 −15 55 51.78 4.799 4.75 0.318 – 3311 – – – – – 1128 PM 1-276 19 02 17.857 +10 17 34.49 3.793 5.214 2.516 2.136 3311 – 15.3 – – – 1129 PM 1-295 19 19 18.760 +17 11 48.09 7.702 7.546 7.139 0.96 1311 – 13.9 – – – 1130 PM 1-310 19 38 52.135 +25 05 32.63 6.213 4.603 1.867 7.758 1311 – – – – – 1132 PM 1-89 15 19 08.724 −53 09 50.05 10.027 9.316 2.292 – 3311 – – – – – 1136 Pe 1-1 10 38 27.607 −56 47 06.40 8.965 8.009 7.825 3.319 3331 3 – 125.3 4.16 0.06 1137 Pe 1-11 18 01 42.767 −33 15 26.30 2.643 2.175 0.823 1.553 1311 9 10.9 8 7.9 0.34 1138 Pe 1-12 18 17 42.379 −28 17 13.80 – 0.476 0.66 0.797 1311 12 – 3.4 10.2 0.59 1139 Pe 1-13 18 34 51.659 −22 43 16.97 0.076 0.731 – 1.028 1311 7 4.4 3 8.29 0.28 1141 Pe 1-15 18 46 24.485 −07 14 34.57 2.534 2.029 – – 3311 5 8.3 8 7.4 0.18 1142 Pe 1-16 18 47 32.251 −06 54 03.52 2.434 2.455 7.163 1.089 3311 – 14.2 – – – 1147 Pe 1-20 18 57 17.351 −05 59 51.79 0.354 0.931 0.129 0.342 1311 8.4 5.1 29.4 4.52 0.18 1148 Pe 1-21 18 57 49.642 −05 27 39.73 1.16 1.48 0.549 3.774 1311 8.6 6.3 30 3.95 0.16 1149 Pe 1-3 10 44 31.116 −61 39 38.47 1.051 2.368 3.299 3.222 1311 8 – 24 – – 1150 Pe 1-6 16 23 54.309 −46 42 15.28 – 4.576 – – 311 7.2 – 40 3.94 0.14 1151 Pe 1-7 16 30 25.852 −46 02 51.10 42.654 25.28 11.357 2.405 3311 5 – 117 – – 1152 Pe 1-8 17 06 22.558 −44 13 09.96 6.277 8.943 6.223 0.763 1311 – – – – – 1160 Pe 2-4 09 30 48.402 −53 09 59.33 2.264 2.602 1.272 0.906 1311 – – – – – 1162 Pe 2-7 10 41 19.574 −56 09 16.34 1.045 1.399 2.067 0.005 1311 – – – – – 1167 SaSt 1-1 08 31 42.877 −27 45 31.70 1.739 1.157 1.544 1.723 1311 – – 0.3 – – 1170 SaSt 3-166 18 29 11.268 −17 27 12.90 1.586 2.059 0.665 4.097 1311 – 3.2 – – – 1171 SaWe 2 17 27 00.197 −27 40 35.11 0.562 2.44 1.572 – 1311 – 14.2 3 – – 1175 Sa 1-8 18 50 44.312 −13 31 02.18 2.218 2.007 – 0.59 3111 5.6 13.5 11 6.33 0.17 1176 Sa 2-21 08 08 44.278 −19 14 03.13 0.069 0.763 1.683 0.197 1311 40 8.5 2.4 4.11 0.8 1177 Sa 2-230 17 42 02.007 −15 56 07.46 1.949 1.323 – – 1311 – 4.9 3.8 – – 1178 Sa 2-237 17 44 42.282 −15 45 11.45 9.836 9.483 – 5.196 1113 – 5.4 – – – 1182 Sa 4-1 17 13 50.356 +49 16 11.26 0.427 0.457 0.832 0.571 1311 – – – – – 1187 Sh 1-89 21 14 07.628 +47 46 22.17 1.096 2.718 0.395 2.673 1311 120 13.5 42.5 1.88 1.09 1191 Sn 1 16 21 04.421 −00 16 10.54 0.277 0.596 1.471 0.928 1311 3 10.4 7 9.42 0.14 1192 Sp 1 15 51 40.934 −51 31 28.39 4.179 8.354 4.189 4.004 1311 72 – 75 1.21 0.42 1193 Sp 3 18 07 15.793 −51 01 10.41 8.052 12.906 6.587 7.967 3333 35.6 – 61 1.75 0.3 1196 StWr 4-10 16 02 13.042 −41 33 35.94 0.041 0.394 – 0.523 1311 – – – – – 1197 St 3-1 07 06 50.888 −03 05 09.50 0.753 0.932 0.385 – 1311 – 7.5 – – – 1198 Ste 2-1 10 11 57.662 −52 38 17.09 – 0.499 – – 1311 – – – – – 1201 SwSt 1 18 16 12.237 −30 52 08.71 17.294 13.034 – 0.315 3311 1.3 26.7 216 3.79 0.02 1203 Tc 1 17 45 35.298 −46 05 23.81 10.648 6.85 0.575 0.533 3311 15 – 801 1.39 0.1 1210 Te 2337 17 48 45.272 −26 43 28.80 10.8 8.5 19.643 – 3311 – 15.2 – – – 1212 Th 2-A 13 22 33.854 −63 21 00.96 4.078 5.185 – 3.694 1311 23 – 60 2.07 0.23 1216 Th 3-12 17 25 06.093 −29 45 16.87 3.613 4.512 – – 3311 1.8 2.6 3.5 – – 1217 Th 3-13 17 25 19.341 −30 40 41.79 8.348 2.537 – – 3111 2 7.4 14.3 – – 1218 Th 3-14 17 25 44.060 −26 57 47.69 2.922 2.598 1.308 – 3311 1.4 5.8 4 – – 1224 Th 3-25 17 30 46.716 −27 05 59.12 0.043 1.042 0.528 2.846 1311 2 14.9 18 8.77 0.09 1225 Th 3-26 17 31 09.297 −28 14 50.42 2.632 2.337 – – 1311 6.6 10.4 10 7.86 0.25 1226 Th 3-27 17 35 58.467 −24 25 29.15 4.357 5.395 2.905 – 3311 3.2 14.4 13.5 – – 1228 Th 3-32 17 35 15.533 −28 07 01.70 3.982 3.019 – 1.552 1311 – 10.2 – – – 1235 Th 4-10 17 57 06.599 −18 06 43.43 1.819 2.087 – – 1311 – 4.3 – – – 1236 Th 4-11 18 00 08.820 −17 40 43.33 1.832 2.515 2.449 – 1311 <5 – 0.2 – – 1238 Th 4-3 17 48 37.390 −22 16 48.79 1.11 1.217 0.433 – 1311 – 2.7 – – – 1244 V-V 3-5 18 36 32.291 −19 19 28.01 1.906 3.073 0.72 2.982 3311 – 11.6 10 – – 1246 VBRC 1 08 30 54.197 −38 18 06.98 1.648 3.486 1.496 3.464 1311 – 37.9 – – – 1248 VBRC 6 14 41 35.992 −56 15 13.74 0.778 1.629 2.02 1.714 1311 – – – – – 1251 VY 2-1 18 27 59.603 −26 06 48.29 4.039 4.763 2.109 – 3311 3.7 32.4 37 – – 1259 Ve 26 08 43 28.087 −46 06 39.72 16.331 10.899 6.139 0.586 3331 – – – – – 1260 Vo 1 06 59 26.405 −79 38 47.20 33.47 21.452 5.513 4.417 3331 – – – – – 1261 Vo 2 08 16 10.000 −39 51 50.67 1.385 1.676 – 0.006 1311 – 60.9 – – – 1262 Vo 3 08 42 16.561 −40 44 10.57 38.376 49.309 57.133 57.844 3333 – – – – – 1264 Vy 1-1 00 18 42.167 +53 52 20.03 1.077 1.394 – 0.028 1311 6 19.8 28.9 5.34 0.16 1265 Vy 1-2 17 54 22.994 +27 59 57.99 1.704 1.184 0.697 – 1311 4.6 11.1 – – – 1266 Vy 1-4 18 54 01.899 −06 26 19.81 1.821 2.476 – 1.253 1311 4.5 19.7 22 6.01 0.13 1267 Vy 2-2 19 24 22.229 +09 53 56.66 31.892 23.912 4.713 4.645 3111 0.6 5.9 50 9.82 0.03 1268 Vy 2-3 23 22 57.952 +46 53 58.24 0.655 0.785 1.564 – 1311 4.6 6.5 3 9.95 0.22 1271 WeSb 3 18 06 00.766 +00 22 38.57 0.261 0.936 2.347 – 1311 – 13.1 – – – 1274 We 1-1 00 38 54.178 +66 23 48.63 0.362 1.02 1.167 0.138 1311 19 5.2 1.5 6.57 0.61 1281 We 1-7 18 44 06.233 −12 12 57.15 – 1.68 3.263 1.739 1311 – 5.3 – – –