uvby − β PHOTOMETRY OF NGC 1647 AND NGC 1778 189

TABLE 4 uvby − β PHOTOELECTRIC PHOTOMETRY OF NGC 1778

WEBDA V b − y m1 c1 [m1] [c1] β MK ST

46 13.014 0.570 0.150 0.380 0.330 0.270 2.830 late 33 10.975 0.250 0.020 0.950 0.100 0.900 2.828 A0 B9 36 11.527 0.240 0.050 0.720 0.120 0.680 2.764 B6 8 11.794 0.250 −0.086 0.750 0.280 0.700 2.753 late 5 11.150 0.240 0.010 0.710 0.090 0.660 2.744 B9.5IV B5 39 11.681 −0.200 0.320 0.810 0.250 0.850 2.740 B7 IV-V A3 41 11.964 0.250 0.010 0.620 0.090 0.570 2.740 B4 32 10.283 0.240 −0.010 0.640 0.070 0.590 2.729 B6 III-IV B3 3 10.190 0.480 0.110 0.600 0.270 0.500 2.699 B6 IV late 141 11.285 0.230 −0.065 0.530 0.070 0.490 2.671 B2 7 11.810 0.280 −0.030 0.840 0.060 0.780 2.664 B6 IV-V B6 31 10.197 0.270 −0.020 0.840 0.070 0.780 2.623 B9 III B6 37 11.599 0.470 0.150 0.360 0.300 0.260 2.617 late 140 9.638 0.280 −0.040 0.630 0.050 0.570 2.614 A0 B3 2 10.104 0.860 0.370 0.360 0.640 0.190 2.585 G8 III late 34 11.437 1.000 0.560 0.310 0.880 0.110 2.579 late

Fig. 2. Left panels (a) LGK86 isotherms for NGC 1647. (b) LGK86 isogravities for NGC 1647. Right panels (a) LGK86 isotherms for NGC 1778. (b) LGK86 isogravities for NGC 1778.