0

0.2

0.4

0.6

0.8

1

1.2

0.9 1.1 1.3 1.5 1.7 1.9 2.1 2.3 LOG ( / m)

RELATIVE FLUX

341.4-09.0 Hb 12 He 2-113 He 3-1333 IC 2501 NGC 6572 PB 5 Vo 1

0 0.2 0.4 0.6 0.8 1 1.2

-1.9 -1.6 -1.4 -1.1 -0.9 -0.6 -0.4 -0.1 LOG (D/pc)

N

RELATIVE FLUXES AND DIMENSIONS FOR SOURCES PEAKING AT 18m

<D/pc> = 0.037 ± 0.072

0

0.2

0.4

0.6

0.8

1

1.2

0.9 1.1 1.3 1.5 1.7 1.9 2.1 2.3 2.5 LOG ( m)

RELATIVE FLUX

A 58 G285.1-02.7 He 2-131 He 2-138 He 2-459 He 2-47 Hf 39 IC 2621 K 3-52 M 1-16 NGC 3918 NGC 5315 NGC 5882 NGC 6210 NGC 6369 NGC 6543 NGC 6826 NGC 7009 NGC 7354 NGC 7662 Pe 1-1 Ve 26 0

0.2

0.4

0.6

0.8

1

1.2

-1.88 -1.63 -1.38 -1.13 -0.88 -0.63 -0.38 -0.13

LOG (D/pc)

N

RELATIVE FLUXES AND DIMENSIONS FOR SOURCES PEAKING AT 65m

<D/pc> = 0.178 ± 0.139

0

0.2

0.4

0.6

0.8

1

1.2

0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 LOG ( / m)

RELATIVE FLUX

Fg 1 He 2-15 He 2-152 He 2-437 M 1-54 MyCn 18 NGC 2392 NGC 3242

0

0.2

0.4

0.6

0.8

1

1.2

-1.875 -1.625 -1.375 -1.125 -0.875 -0.625 -0.375 -0.125 LOG (D/pc)

N

RELATIVE FLUXES AND DIMENSIONS FOR SOURCES PEAKING AT 90m

<D/pc> = 0.195± 0.095