-0.4

-0.3

-0.2

-0.1

0

0.1

0.2

0.3

0.4

-0.4 -0.2 0 0.2 0.4 0.6 0.8

LOG [F(90)/F(140)]

LOG [F(65)/F(90)]

TYPICAL ERROR = 0

= 2

= 1 AKARI FIS COLOUR ANALYSIS OF GALACTIC PLANETARY NEBULAE

80 K

90 K

30 K

-1.2

-1

-0.8

-0.6

-0.4

-0.2

0

0.2

0.4

-0.3 -0.2 -0.1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

LOG [F(90)/F(140)]

LOG [F(18)/F(65)]

AKARI FIS/IRC COLOUR ANALYSIS OF GALACTIC PLANETARY NEBULAE

TYPICAL ERRORS

= 0 = 1 = 2

90 K

130 K

200 K

NON-COLOUR CORRECTED TRENDS